& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Ganges barrage offers Tk 7,340cr benefit a yr

Says feasibility study on the Tk 31,414cr project

Rejaul Karim Byron
By building a barrage in the Ganges river system in Rajbari, the country can stop the salinity creeping in the southwestern region as well as reap a net benefit of Tk 7,340 crore every year, says a government study.
Once the project is completed, the area will produce 25 lakh tonnes of extra rice and 2.4 lakh tonnes of fish yearly, according to the Ganges bar-
rage feasibility study tabled yesterday at an inter-ministerial meeting.
The meeting, held in the National Economic Council auditorium, was chaired by Planning Commission member MA Sattar Mandal.
The total cost of the proposed Ganges barrage has been estimated at Tk 31,414 crore and it can be implemented in seven years, says the study, adding it would take only
seven years to recover this cost.
The water flow of the rivers dependent on the Ganges will increase and distribution of the Ganges water to the rivers of the area could be ensured as per demand during the dry season when the barrage reservoir is built.
About 33 percent of the high-salinity area in the Sundarbans will
have low to moderate salinity. Of the area, 11,000 hectares willhaveverylowsalinity.
Member of the Planning Commission (General Economic Division) Shamsul Alam told The Daily Star that the barrage project is very important to the country and the commission will urge the concerned ministry to forward the project quickly to the planning ministry.
Another high official of the planning ministry said $1.03 billion of foreign currency would be required to bear the total project cost. He added that China had expressedits interest to finance the project.
After the barrage is built, about 52 lakh hectares of
land could be brought under cultivation in different agricultural projects including GK and Pabna Irrigation.
A total of 113 megawatts of hydro-electricity can be generated in the main barrage and an off-track structure in the river Gorai.
The study report also says the amount of underground arsenic will be reduced and the coastal rivers saved from siltation. A direct communications and transport link can be made between the northern and southwestern regions of the country.
Entertainment and tourist spots could be built around the reservoir and in its adjoining areas.
In 2005, the Planning Commission approved a
proposal for conducting a feasibility study of the Ganges barrage. In 2009, the government purchase committee approved DDC and Associates Ltd, an international consultant, for carrying out the study.
Though only 240 kilometres out of the 2,200-kilometre Ganges river flows into Bangladesh, an area of as many as 46,000 kilometres is dependent on the river system.
After India commissioned Farakka barrage in the upstream of the Ganges in 1975, Bangladesh suffered adverse effects as the water flow fell drastically.
In 1996, the Ganges Water Sharing Treaty was signed between Bangladesh and India.