& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

NZ-ENG SCOREBOARD
NEWZEALAND R B 4 6
Guptill lbwbFinn 5 6 10
NicokBairstowbSwann 11 15 1 0
BMcCullumcWrightbFinn 10 10 2 0
Williamson cKieswetterb Briggs 17 23 1 0
TaylorcHalesbFinn 22 23 2 0
Franklin runout 50 33 4 2
NMcCullumnotout 16 10 0 2
Bracewell notout 2 10 0
Extras: (b-3,lb-7,w-4,nb-1) 15
Total: (For6wktsin20overs) 148
Did not bat:Vettorl, Southee, Mills
Fall of wickets: 1 -7,2-20,3-42,4-67,5-107,6-146
Bowler 0 M R W
Briggs 4 0 36 1
Finn 4 0 16 3
Bresnan 4 0 29 0
Swann 4 0 20 1
Broad 4 0 37 0
ENGLAND R B 4 6
KieswetterbVettori 4 14 0 0
Hales bN McCullum 22 15 3 0
WrightcTaylorbBracenvell 76 43 5 5
MorgancBracewellbMIIIs 30 31 1 1
Buttlernotout 5 8 0 0
Balrstownotout 5 2 10
Extras: (lb-3,w-4) 7
Total: (For4wktsin 18.5 oners) 149
Did not bat: Bresnan, Broad, Swann, Briggs, Finn Fallofwickets:1-21,2-38,3-127,4-142
Bowler 0 M R W
Mills 4 0 23 1
Southee 2 0 32 0
Vettorl 4 0 20 1
N McCullum 4 0 22 1
Nicol 3 0 29 0
Franklin 1 0 12 0