& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

NEWS in brief
32nd BCS (special) written test results published
Staff Correspondent
The Public Service Commission yesterday published the written test results of the 32nd (Special) Bangladesh Civil Service (BCS) examinations with a total of2,788 candidates coming out successful.
The results are available on www.bpsc.gov.bd.
The viva-voce of the candidates is likely to be held on October 31, said a press release on the website.
Around 24,556 applicants sat for the first-round exams at 18 centres across the country on March 9, vying for 1,489 vacant posts of various cadres.
The PSC has published the results provisionally and it has the right to modify the results, if neces-
Creative math questions in schools and colleges from 2014
Staff Correspondent
The government has decided to introduce creative questions in mathematics in JSC, JDC, SSC and HSC examinations in phases.
The education ministry issued a circular to this effect yesterday.
According to the circular, creative questions in Mathematics would be introduced in Junior School Certificate and Junior Dakhil Certificate examinations in 2014.
It would be introduced in Mathematics and Higher Mathematics at Secondary School Certificate and Dakhil examinations in 2015, and in Higher Maths in HSC and Alim examinations from 2017.
Under the method, each question has two parts. One part is being prepared following the existing
DoE fines Beximco Pharma Tk 20 lakh for air pollution
Staff Correspondent
The Department of Environment (DoE) yesterday fined a pharmaceutical factory of Beximco Group Tk 20 lakh for polluting the air in Gazipur.
An enforcement team of the DoE detected that the Pharmatech Chemical Ltd at Auchpara of Tongi had no air (exhaust) treatment device, said a DoE press release.
Colleting sample of air from near the factory, the DoE found that it contained 664 and 302 microgram suspended particles per cubic metre while permissible level is 200 microgram.
Contacted, Nazmul Hassan, managing director of Beximco Pharma, claimed that the factory has no toxic emission.
About air treatment device, he said he needed to