& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Madrid reeling as Barcelona coast

AFP, Madrid
Real Madrid slumped to a 1-0 defeat at Sevilla on Saturday as Jose Mourinho's defending champions suffered a second defeat in four matches, their worst start to a La Liga season in over a decade.
Piotr Trochowski got the only goal for Sevilla as Real's haul of just four points so far condemned the Spanish giants to their most damaging opening since the 2001 -02
season.
Real are also eight points behind rivals Barcelona who won 4-1 at Getafe to retain their 100 percent record.
Trochowski grabbed the winner when the German international was quickest to react to a corner after just two minutes.
Cristiano Ronaldo, who was the centre of attention in the build-up to the game after claiming he was unhappy in the Spanish capital, produced two saves from Andres Palop on 10 minutes and another from a tight angle before half-time.
Jesus Navas and Cicinho combined well on the right, and with Alvaro Negredo bravely leading the attack for Sevilla, the
home side always looked dangerous on the counter-attack.
Mourinho showed his discontent by ordering his substitutes to warm-up on the half-hourmark.
Luka Modric and Karim Benzema replaced Angel Di Maria and Mesut Ozil at the interval in an attempt to change the game.
The summer signing from Tottenham, Modric, produced a spectacular save from Palop on 52 minutes, but a minute later Negredo should have doubled Sevilla's
lead.
Sergio Ramos then headed a difficult ball over the bar from almost on the goal-line and with 25 minutes remaining Mourinho made his final change replacing Alvaro Arbeloa with Jose Callejon.
Fernando Navarro made a brilliant last gasp tackle to deny Ronaldo whose face failed to hide his frustration.
Barcelona made it four wins in four games with a 4-1 victory at Getafe.
Brazilian full-back Adriano grabbed an early lead for Barca before Lionel Messi left the bench to grab a double, to make it six
league goals for him, and assure the points for the Catalan side.
Pablo Sarabia got a late consolation for the home side before the recovering David Villa also came off the bench to claim his second of the season.
Barca coach Tito Vilanova was happy with the result but concerned about Carles Puyol who limped off in the second-half, just four days before the visit of Spartak Moscow in their opening Champions League fixture.
"The most important thing is we have 12 points from 12, we tried to control the game and we could have scored a few more," said the coach.
Vilanova decided to rest Messi, leaving the Argentinian to start from the bench for the first time in just over a year.
Cesc Fabregas made a probing run from deep on 32 minutes before stabbing the ball into the path of Adriano who needed only one touch to grab his second goal in two games for the opener.
Messi appeared with 30 minutes remaining to slot home a penalty on 74 minutes after Juan Valera had tripped Pedro Rodriguez.