& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

India take series 2-0

AFP, Bangalore
Cricket
India survived a mini collapse to sweep the series against a fighting New Zealand with a five-wicket victory on the penultimate day of the second and final Test in Bangalore on Monday.
The hosts slipped from 152-2 to 166-5 before achieving their 261-run target in the final session, thanks to a 96-run stand between man-of-the-match Virat Kohli (51 not out) and skipper Mahendra Singh Dhoni (48 notout) underpressure.
India won the opening Test by an innings and 115 runs in Hyderabad.
New Zealand fought well as they twice neutralised India's advantage to storm back into the match on a good pitch before Dhoni and Kohli steered their team home, much to the delight of the nearly 15,000 spectators.
The Indian captain finished the match with a six over mid-wicket off off-spinner Jeetan Patel, who took three wickets. Dhoni hit two sixes and three fours, while Kohli crackedninefours.
India were 77 without loss after brisk knocks from Virender Sehwag (38) and Gautam Gambhir (34) and then 152-2 following a 69-
run stand between Cheteshwar Pujara (48) and Sachin Tendulkar (27) before New Zealand struck back.
The tourists came back strongly after tea, which was taken early due to rain, as they dismissed well-set Pujara, Tendulkar and Suresh Raina (0) in the space of 14 runs.
The 39-year-old Tendulkar was bowled for a third successive innings in the series, this time by fast bowler Tim Southee, after hitting five fours in his 34-ball knock.
The world's leading scorer in both Test and one-day cricket with an unprecedented 100 international centuries, Tendulkar finished the series without a halfcenturyin three innings.
Patel had Pujara caught by Daniel Flynn, who ran backwards from forward short-leg to take a superb diving catch, and then bowled Raina.
Tendulkar and Pujara steadied the innings after Sehwag and Gambhir had fallen in the morning in the spaceofsixruns.
Pujara, who scored a solid 159 in the first Test, was on 37 when he survived a stumping chance off Patel as wicket-keeper Brendon McCullum failed to collect the ball.
McCullum kept wicket in place ofKrugervanWyk, who was injured after being struck
on the arm by a delivery from paceman UmeshYadav while batting on Sunday.
New Zealand skipper Ross Taylor pressed Patel into the attack in the 12th over after pacemen Trent Boult, Southee and Doug Bracewell had failed to provide the breakthrough in overcast conditions.
Sehwag lofted Patel over long-off, the first six of the innings, and then cuthim fora four before falling in the same over. He stepped out to try another big shot, but missed thelineand was bowled.
He smashed one six and seven fours in his 33-ball knock.
Gambhir went for his shots early in the innings, hitting Boult and Bracewell eachfortwo successive fours before falling to a loose shot.
He was caught by Taylor at first slip off Boult after hitting seven fours in his 58-ball knock.
New Zealand were earlier bowled out for 248 in their second innings, adding 16 runs to their overnight total of232-9.
Patel (22), the last man out, looked unhappy with the decision when given caught behind off left-arm paceman Zaheer Khan, as the TV replays suggested he had missed the ball.
Off-spinner Ravi-chandran Ashwin finished with 5-69, his third five-wicket haul in four innings against New Zealand. He was named man-of-the-