& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Roger, Andy beat the heat

AFP, New York
Five-time champion Roger Federer defied 32 -degree heat and crushing humidity to reach the US Open last 16 Saturday as potential semi-final rival Andy Murray almost wilted in the New York sweatshop.
Top seed Federer, bidding to be the first six-time winner in 87 years, defeated Spanish 25th seed Fernando Verdasco 6-3, 6-4, 6-4 in a shade over two hours to make the last 16 for the 12 th successive year.
The Swiss next faces American 23rd seed Mardy Fish, who beat Gilles Simon, the French 16th seed, 6-1, 5-7, 7-6(7/51,6-3.
Fish prevailed in a match which finished after 0100 local time Sunday morning despite hitting 74 unforced errors.
In stark contrast, third-seeded Murray, the 2008 US Open runner-up to Federer, needed almost four hours to clinch a 7-6 (7/5), 7-6 (7/5), 4-6, 7-6 (7/4) victory over 30th-seeded Spanish left-hander Feliciano Lopez.
Olympic champion Murray will next face 15th-seeded Milos Raonic, who defeated American wildcard James Blake 6-3, 6-0, 7-6 (7/3) on the back of 29 aces to become the first Canadian to make the last 16 in 24 years.
Murray, four times a Grand Slam runner-up, had lost only one set in six prior matches against Lopez but had to come back from trailing in all three tiebreakers on Saturday.
Federer only faced one break point against Verdasco, a player he has now defeated five times in five meetings.
"I was never really in big trouble on my service games," he said.
"The heat and wind weren't really a problem, but Fernando keeps you
guessing, he's a great shot-maker."
Murray's 250th career match victory on hard courts, and his seventh in seven meetings with Lopez, came when the Spaniard netted a backhand.
"This was the first match I had played in this humidity for a while so it was tough,” Murray said. "I would like to be in slightly better form but these matches have helped with that."
Eleventh seed Nicolas Almagro kept Spanish hopes alive when he reached the fourth round for the first time with a 7-6 (7/3), 6-7 (4/7), 7-6 (7/2), 6-1 win over American wildcard Jack Sock.
Almagro will meet Czech sixth seed Tomas Berdych, who defeated American 27th seed Sam Querrey 6-7 (6/8),6-4,6-3,6-2.
Croatian 12th seed Marin Cilic, a quarter-finalist in 2009, ended Asian hopes in the singles when he ousted Japanese 17th seed Kei Nishikori 6-3,6-4,6-7 (3/7), 6-3.