& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

GERMANY defend title

AFP, London
Germany won the Olympic title for the second successive time when they triumphed 2-1 against the Netherlands, the former champions, in a blood and thunder final on Saturday.
Both goals were scored by Jan Philipp Rabente, who thus denied the Dutch their dream of becoming the first nation to win both hockey golds at the same Games.
It was also frustrating for the Dutch as they had beaten the Germans in their pool match earlier in these Games.
But this is a very resilient German team, which they proved by scoring three late goals to defeat world champions Australia in thesemiflnals.
Though the Netherlands had reached the final with a 9-2 hammering of Great Britain, they found far fewer openings this time, especially in the first half.
Players with the skill of Florian Fuchs and Christopher Zeller for Germany, and Billy Bakker and Rogier Hofman threatened to break the defensive walls.
Eventually the three best chances of the half were created by the Dutch, but Germany scored the only goal.
First Bakker wriggled through and forced a good save from Max Weinhold, and then Bakker was set up by Robbert Klemperman only for his shot to be deflected just past a post by a defender.
When Rod Weusthof was foiled only by a last ditch parry after a penalty corner it seemed that The Netherlands would make a breakthrough.
Instead Germany did, two minutes from
half-time.
Timo Wess sent a good through ball to Rabente, who forced his way past three defenders and, as he was falling, somehow levered the ball past the goalkeeper.
When Christopher Zeller hit a post for German early in the second half, it seemed to sting the Dutch team.
A period of prolonged pressure eventually brought two penalty corners, the second of which saw Sander deWijn's hit find Mink van der Weerden, the tournament's leading scorer, who smashed it perfectly into a corner.
It was his eighth goal of the tournament, and his seventh from penalty corners, and with a quarter of an hour to go it jerked the match into a last phase of feverish intensity.
As the teams tired, openings began to present themselves more often. But it was Germany who found a little more from their reserves and made the killer thrust.
Rabiente did well to force his way into the penalty circle, only for the Dutch defence to repel the attack.
But when Tobais Hauke launched the ball back into the danger area, two German players plunged for the ball near a post and Rabiente got the golden touch.
There was still time for The Netherlands to rouse themselves for a couple of desperate last efforts, during which a heavy collision caused Germany'sTimoWess to be led off injured.
But it was not quite enough, and the finish saw the pitch strewn with exhausted, laid flat orange-shirted players, and embracing white-shirted ones. Australia scored a deserved 3-1 win over Great Britain which earned them the bronze medal.