& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Chen in different class

AFP, London
China's Chen Ruolin was in a class of her own Thursday, defending her women's Olympic 10m platform diving crown in dominating style to claim her
second gold medal at the London Games.
The Chinese star peeled off five fantastic dives to score 422.30 points and beat her nearest rival by 55.8 points in the most convincing victory in the seven diving events so far at the Aquatics Centre.
Australia's Brittany Broben took silver with 366.50 and Pandelela Rinong claimed the bronze with 359.20 to give Malaysia a first ever Olympic diving medal.
It was China's sixth gold diving medal in London out of seven events. The only dent in China's dominance so far was Russian Ilya Zakharov's triumph in Tuesday's men's 3m springboard ahead of both Qin Kai and defending champion He Chong, which ended China's hopes of sweeping all eight golds.
"I'm very relaxed. It's like it's not the Olympic Games. I feel no high pressure, I'm relaxed," Chen said, with the Chinese flag draped around her shoulders.
"I feel very pleased to have another gold
medal for China."
It was 19-year-old Chen's fourth overall gold medal at the Olympics and she was in blistering form off the high tower.
Chen also became the fourth diver to win women's 10m platform at successive Olympic Games, joining Americans Dorothy Poynton-Hill and Patricia McCormick and China's Fu Mingxia.
She led all scorers with 86.40 on two dives -an armstand back double somersault with one and a half twists and a back two and a half somersault with one and a half twists. Her other dives were scored85.50,84.80and79.20.
Chen, who won the individual and synchronised events as a 15-year-old at Beijing four years ago, was unchallenged in the prelims, semifinal and the final of the London platform event.
Chen earlier won the synchronised 10m platform with Wang Hao.
Broben, 16, ensured she won silver with a closing 81.60 for her back two and a half somersault with one and a half twists to claim Australia's first medal in the platform event since Chantelle Michell-Newbery's gold medal win and Loudy Tourky's bronze in the final at Athens in2004.