& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Zou reigns supreme

AFP, London
China's Zou Kai claimed his fifth Olympic gold medal on Sunday, while Great Britain proved their emergence as a force in world gymnastics by
supplying two of the medallists in the pommel horse final.
Zou's successful defence of his men's floor title gave the 24-year-old his second gold medal of the London Games and his fifth overall, which is more than any other Chinese gymnast.
"This medal means a lot to me," said Zou, whose floor routine was awarded a winning score of 15.933 points.
"It's my fifth Olympic gold medal and I’ve won the most Olympic gold medals in the Chinese team now."
Zou claimed three gold medals at the Beijing Olympics four years ago and he can repeat the feat if he prevails in Tuesday's horizontal bar final.
Runner-up Kohei Uchimura finished with the same score as Russia's Denis Ablyazin — 15.800 -- but the Japanese star took the silver medal on account of his higher execution score.
"Although I wasn't able to get gold today, I think I did really well, so I am satisfied," said Uchimura, who was crowned individual all-around champion on Wednesday.
In the pommel horse final, Hungary's Krisztian Berki took the title by the slimmest of margins to prevent Louis Smith from claiming Britain's first ever artistic gymnastics gold medal.
Berki and Smith finished on the same score — 16.066 points -- but reigning world champion Berki was awarded the gold medal as his execution score of 9.166 was 0.100 points higher than Smith's.
Having won bronze in Beijing four years ago, Smith moved up a step on the podium at the North Greenwich Arena, and the position he vacated was filled by 19-year-old team-mate Max Whitlock.
It gave the hosts their second and third medals of the men's gymnastics tournament, following Britain's shock bronze medal triumph in the team final on Monday.
"A bronze medal for Max, two GB gymnasts on the podium — we're probably one of the best countries in the world at the pommel horse right now," said Smith.
In front of Prince William's wife Catherine, Smith produced a flawless routine to close the final but it was not enough to outstrip the elegant display produced by the long-limbed Berki.
"When I saw Louis Smith's performance, I thought that he could win, because it was quite a strong exercise," said Berki, the reigning world champion.
"Beating two British athletes in London is a great achievement."
There was an upset in the women's vault final, where an error by American world champion McKayla Maroney allowed Romania's Sandra Izbasa to claim the gold.
Maroney, 16, produced an outstanding opening vault but then sat down on her landing on her second attempt, allowing Izbasa to snatch the title with a score of 15.191 points.
Maroney was left with the silver medal, while Russia's Maria Paseka came third.
It is Izbasa's second Olympic gold, after her floor title in Beijing four years ago, and follows on from the bronze medal she won with Romania in the team final on Tuesday. "The vault final is a war of nerves and it showed," said Izbasa, who will also compete in the floor final.