& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

News in Brief
Bazlur Rahman seen as example of positive journalism
Staff Correspondent
Iconic journalist late Bazlur Rahman set an example of journalistic ethics through representing positive news in a positive way, said speakers al a programme yesterday.
Bazlur had enriched journalism in our country through positive features in addition to negative ones, said Bangladesh Bank Governor Atiur Rahman.
He made the remarks at a programme at Kochi Kanchar Mela in the capital to mark the 72nd birth anniversary of Bazlur Rahman.
In 1989, when there was acute food scarcity in Jamalpur, Bazlur asked the renowned journalist Monajat Uddin to cover the news, the governor said.
Agriculture Minister Malia Chowdhury, wife of Bazlur Rahman, among others, attended die programme.
Fire guts warehouses in capital
Staff Correspondent
Eight tin-shed warehouses containing jhut (garment waste) were gutted in a fire in the capital’s Mirpur-13 area early yesterday.
Officials al Fire Services and Civil Defence suspect that the fire was originated from an electric short-circuit around 12:55am.
Six units of fire fighters from different fire stations doused the flames after about two hours' effort.
Abdul Latif, officer-in-charge at Kafrul Police Station,
Fire burns 18 houses in Ctg
Staff Correspondent, ctg
Fire gutted 18 houses in North Sorai Para area in Chittagong city early yesterday.
Jasim Uddin, deputy assistant director at Fire Control and Civil Defence I lead Quarters al Agrabad in Chittagong, said the fire originated from an electric short-circuit at one of the houses, and soon engulfed the neighbouring houses around 1:00am.
On information, four units of fire fighters from Agrabad and Bandar fire stations went to the spot and extinguished the fire around 2:25am.
According to the Fire Service and Civil Defence
DUMCJ's golden jubilee celebrated in North America
Metro Desk
Dhaka University Mass Communication and Journalism (DUMCJ) Alumni Association North America has celebrated golden jubilee of the department in Toronto, Canada.
As part of the celebration, the association organised a discussion meeting on "50 years of journalism education in Bangladesh" al a restaurant at Danforth Avenue on Thursday, said a press release.
Prof Golam Rahman, former chairperson of Mass Communication and Journalism Department at Dhaka University, made a keynote presentation while former teachers and students of DUMCJ and
Summerfield School signs deal with Core Knowledge
Metro Desk
Summerfield International School and Tiny Tots School have recently signed an agreement with Core Knowledge Limited for implementation of DigiClass solutions al different campuses of the schools.
Under the agreement, the Core Knowledge, a venture of Rahimafrooz Group, in partnership with education company Pearson Education Services, will provide to the schools DigiClass solution -- an ICTbased solution that combines modern hardware with syllabus-compliant, multimedia-based interactive content, said a press release.
The DigiClass will allow students of the schools to learn in a multimedia environment, and help to develop an intuitive understanding of Math, Science