& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Petersen propels SA

AFP, Leeds
Alviro Petersen hit a careerbest 182 as South Africa stretched their first innings to 419 before they were bowled out at tea on the second day of the second Test at Headingley on Friday.
After Petersen's marathon innings ended in midafternoon, JP Duminy hit an unbeaten 48 as the last three wickets added 66 runs to pul a further question mark against England's decision to pick an all-seam attack and send South Africa in.
There was irony for England, when part-time off-spinner Kevin Pietersen took his side's first wicket of the day after Petersen and Jacques Rudolph had batted most of the morning in a stubborn sixth wicket stand of 59.
England left out frontline spinner Graeme Swann, opting for four specialist seam bowlers. But the quick men could not make a breakthrough despite bowling accurately in overcast conditions.
Finally England captain Andrew Strauss tossed the ball to South African-born Pietersen, whose second ball spun sharply past the bat as the left-handed Rudolph stretched forward defensively.
Wicketkeeper Matt Prior whipped off the bails and television umpire Asad Rauf ruled that the batsman had not got part of his foot behind the line in time.
James Anderson and Stuart Broad sent down six successive maidens at the start of the day.
In the fifth over Petersen was given out leg before wicket to Anderson by umpire Steve Davis without adding to his overnight score of 124.
But, for the second time in his innings, he called for a review and was reprieved when replays showed the ball would have missed his leg stump.
Petersen went past his previ-
ous Test best of 156 against New Zealand in Wellington in March before he was caught behind off Stuart Broad after batting for 530 minutes. He faced 365 balls and hit 23 fours.
SCOREBOARD
SOUTH AFRICA: First innings (overnight 262-5)
Petersen c Prior b Broad 182 Smith c Bell b Bresnan 52 Amla run out (Bresnan) 9 Kallis c Cook b Anderson 19 DeVilliersb Broad 47 Steyn b Finn 0 Rudolph st Prior b Pietersen 19 Duminy notout 48 Philanderc Bresnan b Finn 13 Morkel c Cook b Broad 19 Tahirc Cook b Anderson 0 Extras: (b-5,lb-6) 11 Total: (All out in 139.2 overs) 419 Fall of wickets: 1-120, 2-132, 3-157, 4-
254,5-259,6-318,7-353,8-375,9-414.
Bowler 0 M R W Anderson 33.2 10 61 2 Broad 35 10 96 3 Finn 32 3 118 2 Bresnan 27 4 98 1 Trott 5 19 0 Pietersen 7 0 26 1 ENGLAND: Strauss, Cook, Trott, Pietersen,