& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

NZ out for 260

AFP, Kingston
Kemar Roach took four wickets as the West Indies dismissed New Zealand for 260 before stumps on the first day of the second test at Sabina Park on Thursday.
Roach finished with 4-70 and both Tino Best and Narsingh Deonarine took two wickets.
Martin Guptill top-scored for New Zealand with 71 and RossTaylor contributed 60.
That left the home side having to bat five overs before stumps, which Chris Gayle and Kieran Powell safely negotiated for the addition of 11 runs.
An unbeaten 62 from Guptill earlier helped New Zealand to reach tea on 152 for three.
West Indies, leading the two-match series 1-0, struck two early blows before lunch in restricting New Zealand to 74 for 2 having won the toss and electing to field.
Guptill formed a fine partnership with skipper Taylor, punishing some wayward bowling from Roach.
SCOREBOARD
NEWZEALAND:Firstinnings
Walling c Gayle b Roach 2
Guptill run out (Best) 71
McCullum c Ramdin b Best 0
Taylorc Ramdin b Best 60
Williamson cSammyb Deonarine 22
Brownlie c Ramdin b Roach 0
Van Wykb Deonarine 16
Bracewell b Narine 14
Wagnerc Best b Roach 23
Southee cSammyb Roach 18
Boultnotout 14
Extras: (b-6,lb-2,w-1,nb-11) 20
Total: (All outin 82.5 overs) 260
Fallofwickets: 1-10,2-11,3-114,4-161,5 162,6-170,7-202,8-202,9-225.
Bowler 0 M R W
Roach 17.5 2 70 4
Best 16 1 40 2
Sammy 10 1 31 0
Narine 26 7 66 1
Samuels 10 2 0
Deonarine 12 3 43 2
WESTINDIES:Firstinnings
Gaylenotout 1
Powell not out 10
Extras: 0
Total: (For no loss in 5 overs) 11 To bat: Fudadin, Samuels, Chanderpaul Deonarine, Ramdin, Sammy, Narine Roach, Best.
Bowler 0 M R W
Boult 3 17 0