& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Phelps's magnum opus

AFP, London
Michael Phelps delivered one more history-making Olympic perfor- mance Thursday, winning the 200m medley to become the first man to win the same individual swimming event at three straight Games.
Phelps, already denied trebles in London in the 400m medley and 200m butterfly, delivered a vintage performance to win in Imin 54.27sec and collect his 20th career Olympic medal -- and his 16th gold.
"The three-peat was hard," Phelps said. "I knew it would be a cool thing to do and add to the resume to be the first guy to do it, it hurt."
He subdued his great rival — teammate Ryan Lochte --who settled for silver in 1:54.90.
Hungarian Laszlo Cseh earned bronze in 1:56.22.
Although it was his first individual gold of the 2012 Games, there was no fist-pumping celebration from Phelps but instead a smile of quiet satisfaction as his mother and sister cheered from the stands.
On the podium, he accepted his medal with another smile, then heaved a huge sigh as the crowd roared. As the anthem played he pressed his lips together, trying to control his emotions.
"On the podium, I tried to compose myself as much as I could," said Phelps, who still had the semi-finals of the 100m fly coming up. "I was hurting too, I was in a lot of pain.
"My legs were hurting and I had to lean against something before they gave out."
Even so, Phelps was happy to find himself on the sofamiliar top step of the podium.
"It is a relief to win an individual gold," he acknowledged. "I fell short in the first couple of events, it is cool to do something no other male swimmer has done." In London, the 27-year-old American has been far from the dominant figure who captured an unprecedented eight gold medals in Beijing.
But his fourth and final Olympics has seen him further cement his legacy by seizing the record for most medals in a career and, now, becoming the first man to complete a golden swimming treble.
Australian icon Dawn Fraser and Hungarian Krisztina Egerszegi both accomplished the feat in women's events.
The 200m medley was among the six gold medals he won in Athens in 2004, and he gave himself a chance at another treble as he returned to post the fastest time in the 100m butterfly heats.
The medley defeat for Lochte was a bitter blow in an event in which he is the world record-holder and world champion. It came quickly on the heels of his bronze medal performance in the 200m backstroke, in which he was the defending Olympic champion.
American Tyler Clary, swimming in his first Olympics after failing to make the team in 2008, ran Lochte down in the last 25m to seize gold in an Olympic record of 1:53.41.
Japan's Ryosuke Irie also steamed past Lochte to take the silver in 1:53.78, 16-hundredths of a second in front of Lochte's 1:53.94.
American Rebecca Soni provided a suitable curtain-raiser to the drama of the Phelps-Lochte duel as she became the first woman to break 2min20sec in the women's 200m breaststroke.
Soni's victory in a world record of 2min 19.59sec made her the first Beijing swimming gold medallist to retain her title and improved on the world record of2:20.00 she set in the semi-finals on Wednesday night.
Japan's Satomi Suzuki took silver in 2:20.72 and Russian Yuliya Efimova captured bronze in 2:20.92.
Ranomi Kromowidjojo of the Netherlands lived up to her favourite's billing in winning the women's 100m freestyle in an Olympic record of53.00sec.
Aliaksandra Herasimenia of Belarus took silver in 53.38 and China's Tang Yi claimed bronze in 53.44.