& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

USA surge to gold

AFP, London
The United States triumphed in the women's team gymnastics final on Tuesday to claim their first gold medal in the event since the victory
of the "Magnificent Seven" at the 1996 Atlanta Olympics.
Russia, runners-up to the US at last year's World Championships, finished second, with European champions Romania pipping 2008 Olympic champions China to the bronze medal.
The USA had dominated in qualifying on Sunday but unlike their male counterparts, who finished a disappointing fifth in Monday's men's final, they reproduced the same high performance level when it mattered.
Their winning score of 183.596 points was even more handsome than their qualifying tally and gave them a comfortable advantage of 5.066 points over the Russians, some of whom were reduced to tears.
Victory was particularly sweet for Jordyn Wieber, who lost out on a place in the individual all-around final to team-mate Alexandra Raisman but played a key role in Tuesday's triumph.
The US team had set the tone in both podium training and qualifying with assured performances on the vault and once again they asserted their authority with three superb Amanar vaults in the first rotation.
Two days on from her individual qualifying heartache, Wieber led the way with a vault that earned her a score of 15.933, before Gabrielle Douglas (15.966) and McKayla Maroney (16.233) followed suit to give the US an ideal start.
The Russians could not compete on the vault, with Maria Paseka almost stumbling off the mat with her attempted Amanar, and the USA led China by 1.733 points after the first rotation, with Russia third.
However, the Russians impressed on the bars -- Viktoria Komova top-scoring with 15.766 — and the USA’s lead had been eroded to 0.399 points by the half-way stage.
The USA kept the pressure on with three solid beam routines and Russia's Aliya Mustafina and Komova both committed errors during their displays to hand the Americans the initiative.
Further woe arrived on the floor for Russia when Anastasia Grishina failed to complete her second tumbling pass, before Kseniia Afanaseva fell badly on her knees.
It put the US in a commanding position, and after Douglas and Wieber produced confident and fault-free floor routines, Raisman secured the gold with yet another