& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

China defend team gold

AFP, London
China bounced back to defend their Olympic men's team gymnastics title Monday as hosts Great Britain snatched a historic bronze
medal -- but missed out on silver to Japan after a judges' inquiry.
Having ranked sixth in qualifying, China appeared to have lost the lustre that saw them dominate on home soil in Beijing four years ago, but they rediscovered their poise to claim a third Olympic team crown in four attempts.
A fall from superstar Kohei Uchimura on the pommel horse initially saw Japan finish fourth, but they successfully appealed against his score, dropping Britain down to third and leaving fuming Ukraine empty-handed.
It provided a chaotic end to proceedings at London's North Greenwich Arena, but Britain were nonetheless able to celebrate a first medal in the team event since their bronze at Stockholm 1912.
With Princes William and I larry watching from the stands, Britain thought they had pipped Japan to silver, but although the Japanese appeal cut short their celebrations, the blow was far harder to take for Ukraine.
Supreme in qualifying, the United Stales never recovered from a poor start on the floor and the pommel horse and finished in fifth place, with Russia sixth, Germany seventh, and France eighth.
Backed by a superb 15.966 routine from Beijing bronze medallist Louis Smith, Britain made an assured start on the pommel horse and were in second place behind Ukraine after the first rotation.
China were sixth after the first rotation but they stormed back on the vault, with Zou Kai, Zhang Chenglong and Feng Zhe all registering scores above 15.900.
United States struggled on the pommel horse, Danell Leyva falling off and John Orozco miscuing his routine to leave last year's world championship bronze medallists in sixth place.
Britain seized the initiative on the vault, as Kristian Thomas earned a massive score of 16.550 with a double piked Yurchenko that prompted a deafening roar from the crowd and left the hosts in third place.
A faultless showing on the parallel bars meant that China led from Japan at the halfway stage, while the USA, so impressive in qualifying, languished in last place.
China hammered home their advantage on the high bar, Zou top-scoring with 16.400 after a routine that wowed the crowd, while the USA's woes continued on the vault, as Orozco and Samuel Mikulak miscued.
Having fallen from the high bar in qualifying, Uchimura produced a supreme
routine that earned him a score of 15.733, but China led their Asian rivals by over two points after four rotations.
Britain's medal hopes took a hit when Sam Oldham fell from the high bar in the fifth rotation, allowing Ukraine to leapfrog them into third place.
Zou's 15.833 floor routine galvanised China's grip on gold and they avoided any mishaps on the pommel to complete victory.
Britain began their last rotation 0.248 Ukraine, but floor routines Daniel (15.533) Thomas 433) saw them steal into third place and claim a first team medal in 100 years.