& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

PSG hold Chelsea

AFP, New York
Former England captain John Terry received a rousing reception at his first match since his acquittal on racism charges Sunday as European champions Chelsea played to a 1-1 drawwithParisSaint-Germain.
The friendly match between two of the world's richest clubs was played at new Yankee Stadium, the $1.5 billion ballpark that opened in 2009 as the new home of the storied Major League Baseball Club the New YorkYankees.
Both clubs received goals from Brazilians, Chelsea forward Lucas Piazon converting a cross by another Brazilian, Ramires, for the equaliser in the 82nd minute.
Nene had scored a goal off a rebound in the box after 30 minutes to give the lead to a PSG side that dominated the first half.
Terry, captain Premier League giants Chelsea, was given a standing ovation by overwhelmingly pro-Chelsea crowd of 38,000 when he entered the match in the 63rd minute.
Terry was found not guilty of racially abusing rival player Anton Ferdinand at the end of a five-day trial at Westminster Magistrates Court in London on July 13.
In another sub-plot, Carlo Ancelotti, who took over as manager of French club PSG in January, was facing the club that sacked him
in May of 2011.
PSG delivered an energetic first half with a line up that included four pure attackers: Ezequiel Lavezzi, Nene, Kevin Gameiro and Javier Pastore.
In the third minute, a long pass from the right flank found Lavezzi wide open in the box. Chelsea keeper Petr Cech was forced to come off his line to thwart the Argentinian's effort.
Nene combined with Lavezzi for a high shot in the 19th and with his captain, right back Christophe Jallet, who mis-fired eight minuteslater.
Nene's outstanding work was rewarded with his goal in the 30th minute. Pastore brought the ball down the left side, eluding three players before firing a shot that bounced off the post and to Nene, who fired into the back of the net from close range.
However, PSG lost their momentum after making eight substitutions to start the second half.
Wholesale second-half substitutions helped Chelsea, however, paying off with the 82nd minute goal from Piazon, who collected a cross from Ramires and slotted the ball inside the left post.
Chelsea continue their North American tour in Philadelphia on Wednesday when they take on the Major League Soccer AllStars in the US league's annual All Star Game exhibition.