& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Amla, Steyn destroy England

AFP, London
South Africa on Monday took a one-nil lead in the three-match series against England, beating the hosts by an innings and 12 runs and securing their first win at the Oval after a masterful display of top order batting.
Hashim Amla's unbeaten 311, ably supported by 182 not out from veteran all-rounder Jacques Kallis and 131 Graeme Smith took the Proteas to637for 2 before they declared, setting England a target of252 to make them bat again.
But with the hosts resuming on 102 for four, England were always facing an uphill battle to save the game and despite some resistance from Ian Bell (55) and Matt Prior (40), saving the task ultimately proved impossible.
England, however, had managed to survive the first session virtually unscathed, moving to 177 for five at lunch, with the only wicket to fall that of Ravi Bopara, who was bowled off an inside edge by Dale Steyn for 22 in the seventh over.
Steyn bowled an accurate spell at the start of the day but his wicket came off a short, wide ball, which Bopara tried to punch to the off side, only to get a thick inside edge which caused the ball to crash into his stumps.
Bell was dropped by stand-in wicketkeeper AB de Villiers off legspinner Imran Tahir when he was on 20, with De Villiers failing to hold a thin edge in Tahir's first over of the day, shortly before the morning drinks break.
Bell and Bopara put on 50 for the fifth wicket and Bell found another useful partner in Matt Prior as the pair added 86 for the sixth wicket.
Both batsmen were caught by Kallis — Prior off spinner Imran Tahir and Bell off Steyn after four-and-a-half hours at the crease and 220 balls.
Steyn took three wickets in 16 deliveries with the second new ball, including Bell's, whom he had caught at second slip, giving him five for 56 and seven wickets in the match, as England could only manage 240 all out in their second innings.
Stuart Broad gloved a catch down the leg side in Steyn's next over. He was given not out by umpire Asad Rauf but South Africa successfully sought a television review which showed the ball brushed his glove.
Graeme Swann then tried to attack the bowling and hit seven runs off nine balls before driving Steyn to cover.
Last man James Anderson
was dropped by a diving JP Duminy at point off Steyn before he had scored and delayed the inevitable for more than half an hour before he was trapped leg before wicket by Tahir.
The victory is South Africa’s first in 11 matches at the Oval and they had previously lost all three Tests at the south London venue since returning to international cricket in 1991.
The last time the two teams met in England in 2008, South Africa edged the hosts 2-1 but England have been unbeaten at home since then, rising to number one in the world rankings under captain Andrew Strauss and coach Andy Flower.
South Africa, though, have not lost an away series since they were beaten in Sri Lanka in 2006. They are currently ranked third but will take the top place from England if they win the series.
The win was only the fifth time a team had won a Test match losing only two wickets.
The previous occasion
was by South Africa against Bangladesh in Chittagong in 2002-03. All the other instances were wins by England, including one against South Africa at Lord's in 1924.
SCOREBOARD ENGLAND:Firstinnings385 SOUTH AFRICA: First innings 637-2 dec (Amla 311 n o, Kallis 181 n o, Smith 131) ENGLAND: Second innings (overnight 102-4) Strauss c Philander bTahir 27
Cooke DeVilliers b Philander 0
Trott c De Villiers b Steyn 10
Pietersen b Morkel 16
Belle Kallis b Steyn 55
Bopara b Steyn 22
Prior c Kallis b Tahir 40
Bresnan not out 20
Broad c De Villiers b Steyn 0
Swann c Petersen b Steyn 7
Anderson lbw bTahir 4
Extras: (b-11, lb-15, nb-12,w-1) 39
Total: (All out in 97 overs) 240
Fall of wickets: 1-2,2-32,3-57,4-67,5-117, 6-203,7-210,8-210,9-218.
Bowler 0 M R W
Morkel 16 0 41 1
Philander 19 6 29 1
Steyn 21 6 56 5
Tahir 32 7 63 3
Kallis 7 1 22 0
Duminy 2 13 0
Result: South Africa won by an innings and 12 runs.