& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

92pc pass in Alim exams

Madrasas retain top position

Staff Correspondent
Madrasa Education Board has topped the list of the 10 educati
year's Higher Secondary Certificate and equivalent examinations.
The board's pass rate was 89.57 percent last year while 86.55 percent in 2010.
The number of both the examinees and the Grade Point Average (GPA) -5 scorers under madrasa board has also increased this year.
A total of 84,246 examinees took the Alim examinations this year while the number was 76,015 last year. The number of GPA-5 scorers is 7,073 this year while it was 4,276 last year.
Of the 84,246 examinees, - 35,526 female and 48,720 male -- 77,316 passed the Alim examinations this year under madrasa board.
Female students have done slightly belter, securing a 91.90 percent pass rate whereas the pass rate of male students is 91.68 percent. However, 4941 male examinees scored GPA-5, outnumbering 2132 female examinees who achieved it.
Although the average success rate of all the education boards has increased by 3.59 percent this year compared to last year, in case of madrasa board it rose by 2.20 percent.
The average pass rate of the 10 education boards is 78.67 percent this year.
Of the 2651 madrasas, 767 obtained a 100-percent success rate, while two madrasas have not succeeded at all.
Overall, Tamirul Millat Kamil Madrasa in Dhaka ranked number one like the previous year while Jha 1 okathi NS Kamil Madrasa and Tamirul Millat Kamil Madrasa in Tongi of Gazipur secured the second and third positions respectively.
Meanwhile, the Technical Education Board's overall pass rale rose to 84.32 percent from last year's 84.05 percent. The number of examinees and GPA-5 achievers under this board has also increased this year.
Out of 86,705 examinees -- 58,634 male and 28,071 female — 73,106 examinees succeeded this year. Of the successful ones, 2211 examinees achieved GPA-5, 1040 male and 1171 female.
A total of 6 2,654 examinees took the vocational examinations under the technical board last year.
Hajiganj Model College, Hajiganj, Chandpur ranked top under the Technical Education Board.