& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Murray moves on

AFP, London
Andy Murray on Tuesday reached a fifth successive Wimbledon quarterfinal where he will meet Spanish bulldozer David Ferrer who has made the last eight for
the first time at the 10th attempt.
British fourth seed Murray beat Croatian 16th seed Marin Cilic 7-5,6-2,6-3 as organisers scrambled to make up for lost time caused by heavy rain.
He will now attempt to go on to a fourth All England Club semifinal on the trot, but will first have to get past seventh-seeded Ferrer who put out former US Open champion Juan Martin del Po tro 6-3,6-2,6-3.
Murray had led Queen's Club winner Cilic, against whom he was defending a 5-1 career record, 7-5, 3-1 overnight when play was suspended due to Monday's downpours.
They played two games Tuesday before more rain sent them off Court One for an hour.
But on the resumption, the Scot was rarely troubled as Cilic struggled with his opponent and the damp, chilly conditions.
Only three of the scheduled last 16 men's ties had been completed on Monday with Novak Djokovic, Roger Federer and Mikhail Youzhny able to enjoy a day-off before Wednesday's quarterfinals.
Federer will play Youzhny looking for a 14th win in 14 matches against the Russian.
Defending champion Djokovic will tackle German 31st seed Florian Mayer, who reached the quarterfinals for the second time, eight years after his first appearance, with a 6-3,6-1,3-6,6-2 win over French 18th seed Richard Gasquet.
It was Mayer's first win over 2007 semifinalist Gasquet since 2004 and was sweet revenge for losing a Davis Cup quarterfinal rubber to the French player in 2011 after being two sets to love ahead.
Ferrer never got the chance to start his match on Monday, but the 30-year-old, now carrying Spain's hopes after the shock elimination of Rafael Nadal, wasted no time against ninth seed Del Potro, racing home beneath the Centre Court roof in under two hours.
Del Potro, who had also made the last 16 in 2011, was undone by 20 unforced errors compared to Ferrer's more conservative eight.
Philipp Kohlschreiber, the 27th seed, became the second German into the last eight, ending US qualifier Brian Baker's fairytale run with a 6-1,7-6 (7/4), 6-3 win in an hour and 55 minutes on Court 12.
He will face either French fifth seed Jo-Wilfried Tsonga or US 10th seed Mardy Fish in the last eight.
Kohlschreiber, who fired 23 aces, goes fourth on the list of the most Grand Slams played before reaching the last eight, having got there on the 33rd attempt.