& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Environmental Leader in Sustaining
Akij Group, feels proud to take the first step in Bangladesh in carbon trading through major initiatives. It is not only a corporate obligation but as an organization we feel the responsibility of taking care of the environment we live in. Akij Group have been working hard on minimal emission of carbon footprint and we believe if we collectively try this, then together and only together can a greener place be built for the future. Akij Group is already working on carbon trading, so that in future we can control pollution by providing economic incentives to achieve reductions in the emissions of pollutants.
Akij Food & Beverage Ltd. installed the first ever CO2 sequestrating plant of one ton CO2 per hour capacity from the exhaust of the waste flue gas of the boilers which would have otherwise been exposed to the atmosphere and have caused pollution. We have been able to reduce the total emission from our CO2 sequestration plant by 7800 tons CO2 per year and the exhaust heat recovery plant by 6600 tons CO2 per year which when combined is a emission reductions of
14400 tons per year.
Akij Particle Board Mills Ltd.- The only company in the country who have the largest Bio Mass plant (renewable source of energy) generating 15 MW of heat energy by using the process residue, which is certainly unique in the industry and the country. It helps save more then 29 million cubic meter of natural gas and 48000 tons (certified emission reduction) of CO2 gas per year and is now in global market for trading.
Akij Textiles Mills Ltd. - Operates one of the largest combined heat and power generation plant and one of the largest biological Effluent Treatment Plant. All the process water gets discharged after maintaining the appropriate BOD and COD. With the flue gas it operates in more then 2000 tons of chilling plant for process and plant cooling resulting in substantial quantity of natural gas and reduction of CO2 from the environment.
Akij Cement Company Ltd. - Cement is one of the largest sources of CO2 in the World. Where Akij Cement produces nearly a million tons of
cement with approx. 40% less of CO2 emission and saves 30% energy compared to other traditional industries in the country by its unique VRM technology. By installing very large VFD (Vertical Roller Mill) we have reduced power consumption by 10% to become the most environmental friendly cement produced in Bangladesh.
Akij Ceramics Ltd. - Uses technologies that produce ceramic and porcelain tiles with the lowest heat value and also uses flue gas in an unique way for the production process. This singles out our plant as one of most environment friendly plants in the region.
The carbon emission reductions are made possible by technical assistance from a famous German/Danish company. We take pride in exhibiting that obligation, love of mother nature and business can co-exist in our country. We thank our respected customers and stakeholders who have helped us in building a green earth today and for tomorrow.
Sk. Bashir Uddin
Managing Director, Akij Group