& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Lecce hold Juve

AFP, Rome
Ten-man Lecce threw a span nerintheSerieAtitleworksas they held Juventus to a 1-1 draw on Wednesday, allowing AC Milan to close the gap at the top to just one point.
Juve seemed to be cruising to victory after an early goal while their relegation-threatened opponents were reduced to 10 men early in the second period.
But Andrea Bertolacci's goal five minutes from time snatched a draw and allowed Milan, 2-0 winners over Atalanta, to reduce their arrears.
And it was a horror mistake from Juve goalkeeper Gianluigi Buffon that gifted Lecce the equaliser, suggesting the Turin giants might just be cracking under the title pressure.
It ended Juve's eightmatch winning run and gives Milan renewed hope of retaining their crown.
Juve were off to a dream start and it came from their fabled midfield.
The incomparable Andrea Pirlo was given too much time on the edge of the box and he put in a delightful chip over the defence for Claudio Marchisio to run onto and although his header looked tame, goalkeeper Massimiliano Benassi seemed to slip and the ball crept in.
Marchisio was next to send a clever chip over the top for Arturo Vidal to run onto but he swept his left foot shot just past the upright.
Any chance Lecce had of dragging themselves back into the contest seemed to die 10 minutes into the second period when Juan Cuadrado was harshly sent off for a second booking.
Juve missed a hatful of chances but then Buffon's first touch from Andrea Barzagli's back-pass was horribly heavy and Bertolucci nipped in to rob him and score.
Milan started brightly and a pair of efforts from Kevin-Prince Boateng and one from Zlatan Ibrahimovic tested goalkeeper Andrea Consigli.
On nine minutes, Boateng found Muntari in the box, although the Ghana midfielder was perhaps offside, to poke in from close range.
It wasn't all one-way traffic as Milan goalkeeper Christian Abbiati was forced into a diving save to keep out German Denis's header.
Milan enjoyed the lion's share of chances but they had to wait until injury time to wrap up the points through Robinho.
Inter Milan's Champions League hopes took a knock as they lost 3-1 at Parma and now trail Napoli and Udinese by three points in the race for third.
Inter took the lead after just 13 minutes as Dejan Stankovic tried to tee up Diego Milito but his cross was too far in front of the Argentine forward, only for Wesley Sneijder to arrive at the back post to squeeze in the ball from a tight angle.
But two goals in two minutes turned the game on its head.
Sebastian Giovinco robbed Lucio and then nutmegged Walter Samuel to set up a tap-in for Jose Marques.
And moments later diminutive striker Giovinco nipped between the two centrehalves to run clear and fire in off the bar.
Former Inter forward Jonathan Biabiany sealed the points late on with the third.
Udinese matched Napoli's points with a 1-0 win at already relegated Cesena, although they trail the southerners on head-to-head record.