& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Great Kiwi escape

South Africa take series 1-0

AFP, Wellington
A heroic century by 21 -year-old Kane Williamson trumped a hostile South Africa bowling attack and allowed New Zealand to hang on for a tenacious draw in the third Test Tuesday.
South Africa secured the series 1-0 but were on the verge of a second victory before tea after a sensational bowling performance by Morne Morkel reduced New Zealand to 83-5.
In a dramatic final session, New Zealand lost only one further wicket as Williamson held firm in a defiant 80-run stand for the sixth wicket with Kruger van Wyk, following that with an unbeaten 37-run partnership with Doug Bracewell.
The South African fieldsmen grounded multiple chances helping New Zealand reach 200-6 at the close after South African captain Graeme Smith set an imposing 389-run target.
Morkel ripped out the New Zealand top-order to finish with career best figures of six for 23 which won him the man-of-the-match award over Williamson.
But Morkel and fellow quicks Dale Steyn, Vernon Philander and Marchant de Lange had reason to believe they could have cleaned out New Zealand had the fielding been sharper.
Williamson, batting at four in place of the injured skipper Ross Taylor, survived a painful strike in the groin and at least four edges behind the stumps includ-
ing a low catch claimed by Alviro Petersen at point.
Television replays showed the ball may have hit the ground first and the decision went in favour of the batsman who at that stage was on seven but went on to post his second century from 228 balls, spending 327 minutes at the crease.
When Morkel cleaned out Dean Brownlie (15) and Daniel Vettori with successive yorkers, van Wyk entered the fray and took several balls to the body as he made 39 in 100 minutes.
With his dismissal and 19 overs remaining, the writing looked on the wall for New Zealand with only tailenders Doug Bracewell, Mark Gillespie and Chris Martin to bat.
Bracewell had scored a duck in his previous three innings in the series but played confidently as he supported Williamson to be 20 not out after he was dropped by de Villiers on eight.
South Africa had resumed the day at 75 without loss and and raced to 189-3 before declaring with de Villiers belting 68 and JP Duminy unbeaten on 33.
Morkel started his destructive campaign in New Zealand's second over when Daniel Flynn gloved a rising delivery through to wicketkeeper Mark Boucher to be gone without scoring.
Brendon McCullum also failed to get off the mark before Morkel trapped him lbw and Martin Guptill edged the strike bowler to Jacques Rudolph at gully
and was gone for 18.
Brownlie faced 18 balls without scoring before launching into de Lange and taking 14 off one over, including three boundaries, but he was to add only one more run before Morkel struck again.
Meanwhile, Taylor, who suffered a broken forearm when hit by Morkel on the fourth day, underwent surgery Tuesday and the New Zealand management said he would be sidelined for at least four weeks.