& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Federer, Nadal sail

Tennis

AFP, Indian Wells
Former winners Roger Federer and Rafael Nadal breezed through with straight-set wins Sunday as a flu bug wreaked havoc on the men's and women's draws at the Indian Wells tournament.
Reigning Wimbledon champion andWTA Player of the Year Petra Kvitova was knocked out early when 19-year-old American Christina McHale fought back to beat the Czech in three sets.
But the biggest problem eating into the draw Sunday was a stomach virus that has forced at least eight players to withdraw or retire within the last two days, including men's 14th seed Gael Monfils and women's ninth seed Vera Zvonareva.
Third seed Federer defeated wild card Denis Kudla 6-4,6-1 in a second round night match on centre court.
The Swiss master said he was also feeling a bit sick, but not as bad as his family members and notenoughtobe thrown off his game.
Federer hammered eight aces and won 79 percent of his first serve points in the 57 minute contest.
Federer, who won Indian Wells three straight years from 2004-2006, advances to the third round where he will face hard-serving Canadian Milos Raonic, who beat Carlos Berlocq in straight sets 6-4,6-2.
It will be the first career meeting between the former world number one Federer and Raonic who has already won two singles titles on the tour this year.
Nadal, a two-time Indian Wells champ, routed Leonardo Mayer 6-1,6-3.
It marked the Spaniard's first match since losing to world number one Novak Djokovic in a monumental five hour, 53 minute final at the Australian Open.
Nadal advanced to the third round, where he will face fellow Spaniard Marcel Granollers, who beat Tommy Haas of Germany 6-3,2-6,6-3.
The left-handed Nadal hit one ace, posted two double faults and won four of six break point chances.
Ninth seed Juan Martin del Potro defeated Australia's Marinko Matosevic 7-5, 6-2 in their second round match.
Sixth seed Jo-WilfriedTsonga advanced to the third round when Michael Llodra pulled out of their all-French clash with a knee injury. Tsonga was ahead 4-1 in the first set when Llodra packed it in.
On the women's side, McHale rallied to upset Czech Kvitova in three sets 2-6,6-2,6-3.
McHale finished the match by winning her service game to nothing, with a backhand slice winner sealing the victory.
Top seed Victoria Azarenka defeated two-time grand slam winner Svetlana Kuznetsova 6-1, 6-2, extending her season-long winning streak to 19-0.
World number one Azarenka advanced to the fourth round where she will face Julia Goerges who beat Anabel Medina Garrigues ofSpain6-3,6-4.
Azarenka faced Goerges three times in 2011, winning two semi-finals encounters at Madrid and Luxembourg.