& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Lions bite back

Sports Reporter
England Lions levelled the series 1-1 through a six-wicket win over Bangladesh A in the second one-day game at the Zohur Ahmed Chowdhury Stadium in Chittagongyesterday.
The lack of fight from the home side was inevitable as they had to make six changes to their first match's winning line-up with all four of the performers -■ Al-Amin Hossain, Noor Hossain Munna, Mahmudullah Riyad and Imrul Kayes — called back for club cricket duty.
This meant that a thinned Bangladesh A batting line-up took on the visitors and were prompdy bowled out for 176 runs in 44 overs after deciding to bat first. England Lions took just 37.3 overs to knock off the total despite losing four wickets.
Nazimuddin was the only local batsman to show some heart to battle it out as the right-hander hammered 99 not out after arriving at the crease to face the game's fifth ball.
The Chittagonian struck eight boundaries and four sixes in his 125-ball effort, though he deserved a century, especially since only two other batsmen took their total to double figures. Nazimuddin added 81 for the eighth wicket with Dollar Mahmud, who made 17, after beginning the recovery through the 31-run seventh wicket stand with Sohrawardi Shuvo.
Later, the dismissal of Robiul Islam off the last ball of the 44th over crushed Nazimuddin's hopes of a century.
For the visitors, fast bowler Stuart Meaker snapped four wickets while the spin duo of Scott Brothwick (leg-spin) and Danny Briggs (left-arm orthodox) picked up two each.
Robiul however more than made up for his batting folly with a wicket off the first ball of the innings — removing Jason Roy for a duck. Joe Root, the other opener, fell
in the sixth over to Shuvo but James Vince and skipper James Taylor put together a 48-run third wicket stand to get into a stable position. Later it was Jonny Bairstow's unbeaten 50 that took the visitors home with 12.3 overs to spare. The right-hander smashed six boundaries in his 65-ball knock, and shared an unbroken 70-run fifth wicket stand with Jos Buttler, who was not out on 41 off39 balls with six boundaries.
The third match of the series will be played on January 13 at the same venue. SCORES IN BRIEF
BANGLADESH A: 176 all out in 44 overs (Nazimuddin 99 not out, Shuvo 20, Dollar 17; Meaker 4-47, Brothwick 2-33,Briggs2-38).
ENGLAND LIONS: 177-4 in 37.3 overs (Bairstow50 notout, Vince 44, Buttler 41 not out; Robiul 2-20, Shuvo2-38).
Result: England Lions won by six wickets.