& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Lazio new-boys shine

AFP, Rome
Champions AC Milan were held to a 2-2 draw by Lazio at the San Siro to kick off the new Serie A season on Friday following the player
strike that postponed the original start two weeks ago.
Miroslav Klose and Djibril Cisse both scored on their Lazio league debuts to give the visitors a dream start but Zlatan Ibrahimovic and Antonio Cassano struck back to snatch a point for the hosts.
Lazio proved their summer spending has vastly improved their forward line and could be contenders while Milan showed through their fight-back that they're not going to give up their tide easily.
Lazio went ahead on 12 minutes when Stefano Mauri crossed for Klose, whose first touch with his right was brilliant to beat Alessandro Nesta before he finished crisply with his left.
Cisse then pounced on a mix-up between Gennaro Gattuso and Nesta but after Christian Abbiati parried his fierce shot, Klose on the stretch poked wide.
Lazio didn't have to wait long for their second, though, as on 21 minutes Mauri was given time to swing in a cross and Cisse, running across the backline, got ahead of Nesta to flick a header beyondAbbiati.
The visitors were full of verve, panache, energy and desire up front but they proved vulnerable at the back as Milan's own forwards started coming into the game.
On 29 minutes Aquilani played the
ball down the inside right channel to Cassano, who teed up Ibrahimovic for a simple tap-in.
Kevin-Prince Boateng almost surprised Bizzarri at his near post but from the resulting corner Cassano held off his marker to head home from close range on 33 minutes.
By the start of the second period Lazio' s bright start had lost its steam.
Cassano had a good early chance but shot j ust wide of the far post.
That sparked Lazio back into life and Cisse scampered through the middle to dink the ball past Abbiati but a dogged Nesta got back in time to hack the ball behind for a corner.
Milan almost produced a grandstand finish five minutes from time as Ibrahimovic got behind the Lazio backline but Bizzarri again did well to block his shot.