& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

FICA against lie detector tests

Cricket

AFP, Sydney
The world cricketers' association said Thursday it "outright rejects" the MCC's proposals to encourage players to take lie detector tests in an effort to fight corruption within the game.
The Marylebone Cricket Club (MCC), the guardian of the rules of cricket, says the potential use of lie detector tests should be widely debated.
Former Australia captain Steve Waugh, an MCC member, this week took a lie-detector test as part of his bid to help root corruption out of cricket.
But the Federation of International Cricketers' Associations (FICA) said the testing was irresponsible and it would oppose such actions in "the strongest possible manner".
"It is FICA's strong position that the use of lie detectors as a means of determining the guilt or innocence of a player in matters relating to corruption on any practice for that matter is to be rejected outright," FICA chief executive Tim May said in a statement.
"I commend MCC and
Steve Waugh for trying to be proactive in the fight against corruption, but lie detector tests are far from foolproof and not permissible as a means of determining people's guilt or innocence in the courts of the majority, if not all, cricketing territories.
"It is therefore totally unacceptable that players should be put under pressure to submit to testing that is far from foolproof.
"To publicly request players to make 'some stand' against corruption, by submitting to this 'imperfect' testing is irresponsible and FICA will oppose such actions in the strongest possible manner," Maysaid.
"It's a no-win situation for the players. They quite rightly should decline to submit to one — the testing is not foolproof.
"The players are not under suspicion for any corruption offence but now with the MCC publicly encouraging them to submit to one, if the player refuses, it looks like he is hiding something."
FICA said it was committed to ridding the game of corruption, but would not stand by and have players subjected to a testing technique that had the propensity to churn out incorrect
conclusions.
May said he had written to the MCC to address the matter in a" responsible manner".
Waugh was spurred into action following last year's allegations by Britain's now defunct News of the World tabloid that former Pakistan captain Salman Butt, and bowlers Mohammad Aamer and Mohammad Asif were involved in the deliberate bowling of no-balls during a Test against England at Lord's as part of a betting scam.