& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

European stocks drop

AFP, London
Europe's stock markets dropped sharply on Friday after the European Union said it was studying a possible Greek debt 'rescheduling.'
London's benchmark FTSE 100 index of top shares ended down 1.55 percent at 5,765.80 points, while in Frankfurt the DAX fell 1.25 percent to 7,069.90 points and in Paris the CAC 40 dropped 1.90 percent to 3,805.09 points
Prior to the announcement, markets had been mostly rising despite weak British manufacturing data and Toyota unveiling a disappointing profits forecast.
International backers of a second bailout plan to ward off the threat of Greece defaulting on its massive debts are now studying a possible "rescheduling," the European Commission said on Friday.
British manufacturing output was hit in April by the royal wedding and Japan's tsunami disaster. Workers were given a day off on April 29 to celebrate the wedding of Prince William and Kate Middleton, while Japan's natural disaster meant vital parts could not be sent abroad to Britain, hitting production.
Manufacturing output is suffering across the West as factories produce less amid slack demand for goods.
Japanese auto giant Toyota said it expected annual net profit to drop 31 percent to $3.5 billion onastrong yen and the effect on production of Japan's recent natural disasters.
Shares in European car giants were also down.
In Germany, BMW dropped 0.94 percent to 62.34 euros, Daimler fell 1.78 percent to 46.58 euros and Volkswagen slid 1.53 percent to 125.55 euros.
In France, shares in Peugeot dropped 3.34 percent to 27.46 euros on a ratings downgrade by HSBC, traders said.
Elsewhere in Europe, Swiss stocks slid 1.18 percent, Brussels fell 1.59 percent and Madrid tumbled 1.69 percent.
US stock markets opened firmly in the red Friday and by 1600 GMT the Dow Jones Industrial Average was down 1.16 percent at 11,983.77 points.
The broader S&P 500 lost 1.14 percent to 1,274.33 points, while the tech-rich Nasdaq Composite gave up 1.22 percentto 2,652.12points.
Asian markets closed mixed on Friday after the Dow in New York rose for the first time in six sessions overnight but a rate hike in South Korea and persistent fears over tightening in China kept dealers nervous.