& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Uruguay, Mexico thru’ to R2

SOCCERNET
A first-half goal from Luis Suarez was enough to help Uruguay secure top spot in Group A and progress into second round of the World Cup after a close victory over Mexico, who also qualified.
The only goal came two minutes before half-time when Edinson Cavani's superbly floated cross allowed theAjaxstrikerto head in at the backpost.
With hosts South Africa unable to alter the goal difference too much in their 2-1 win over France, the result in Rustenburg also put the nervous Mexicans through.
Their coach Javier Aguirre made two changes to his line-up, bringing in veteran Cuauhtemoc Blanco for his first start in place of the injured Carlos Vela up front, while Andres Guardado was in for the suspended Efrain Juarez.
Uruguay also made one surprise change, with Diego Godin dropping to bench in place of Mauricio Victorino.
There was a buzz in the Royal Bafokeng Stadium at the start, with most of the noise coming from the fans in green, who outnumbered those in blue. But the Mexicans and their supporters were almost silenced early on.
First Maxi Pereira saw his rising 30-yard free-kick fly over, and then an error from Hector Moreno allowed Suarez in but the
striker only managed to send his shot across the face of goal.
El TH had a good chance moments later when Giovani dos Santos crossed for Blanco, but the 37-year-old headed over.
After 15 minutes Victorino managed to find space from a corner but nodded his free header over, before Alvaro Pereira drilled his shot wide after racing down the left -much to the fury of the unmarked Diego Forlan in the box.
Midway through the half, Guardado almost stunned Oscar Tabarez's side with a wicked 30-yard effort that beat Fernando Muslera, but not the underside of the crossbar.
At the other end, Oscar
Perez punched weakly at a Forlan cross, but there was no one following up at the back post. The chances seemed to dry up 15 minutes before the break, but then Suarez broke the deadlock.
Aguirre decided to make a change at the break, bringing Pablo Barrera for Guardado. And his side had the first chance of the half courtesy of a Blanco free-kick 25-yards out that was curled into the arms of Muslera.
Uruguay then almost doubled the advantage when Forlan swung over a free-kick from the right, but Diego Lugano's powerful header drew an excellent low save from Perez.
MEXICO 0 - 1 URUGUAY
SUAREZ 43
Mexico (4-3-3): Oscar Perez, Francisco Rodriguez, Carlos Salcido, Rafael Marquez, Ricardo Osorio, Hector Moreno (Israel Castro, 57), Gerardo Torrado, Dos Santos Giovani, Andres Guardado (Pablo Barrera, 46), Guillermo Franco, Cuauhtemoc Blanco (Javier Hernandez, 63)
Uruguay (3-5-2): Fernando Muslera, Diego Lugano, Jorge Fucile, Mauricio Victorino, Alvaro Pereira (Andres Scotti, 77), Diego Ruso, Maximiliano Pereira, Egidio Rios, Edinson Cavani, Luis Suarez (Alvaro Fernandez, A, 85), Diego Forlan
Venue: Royal Bafokeng Stadium, Rustenburg