& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Man Utd Fall to Villa

Chelsea keep lead

ATP,London
Chelsea extended their lead at the top of the English Premier League table despite a 3-3 draw with Everton on Saturday after champions Manchester United suffered a
shock 1-0 lossat home to Aston Villa.
The results left Chelsea three points in front of second-placed United.
Sir Alex Ferguson s men kicked off Saturday's late match knowing Chelsea had already dropped points.
But they were undone when Villa striker Gabriel Agbonlahor headed in a cross from fellow England international Ashley Young in the21st minute.
United striker Wayne Rooney hit the crossbar and late on visiting goalkeeper Brad Friedel saved from Dimitar Berbatov as Villa, winning at Old Trirfford for the first time in 26 years, moved up into third place.
Everton went ahead at Stamford Bridge when Louis Saha's header came off the post and hit Chelsea goalkeeper Petr Cech for a 12th-minute own goal.
But Didier Drogba, played in by Frank Lampard, levelled for Chelsea in the 18th minute with a shot from the edge of the box.
Fellow forward Nicolas Anelka gave Chelsea, beaten 2-1 by Manchester City last weekend, the lead with a well-taken finish in the 23rd minute.
But Everton fought back when substitute Aiyegbeni Yakubu made it 2-2 on the stroke of half-time.
Ivory Coast striker Drogba restored Chelsea's lead by powering in his 18th goal in 20 games in all competitions this season in the 59th minute.
But minutes later Everton were level again when Drogba's headed clearance hit Saha on the head and looped over Cech.
Wolves climbed out of the relegation zone
with a 1 -0 win away to Tottenham, who missed out on the chance to go third.
Manchester City, reduced to 10 men, came back three times In a 3-3 draw with struggling Bolton while Birmingham beat West Harn 1 -0.
Younes Kaboul's stoppage-time equaliser gave bottom of the table Portsmouth a 1-1 draw away to Sunderland after Darren Bent had put the hosts ahead.
But the French defender's joy was cut short when he was sent-off for removing his shirt while celebrating the goal, having already been booked.
Elsewhere, Burnley and Fulham drew 1 -1, Stoke and Wigan finished all square at 2-2 and Hull and Blackburn shared the points in a goalless draw.
Ivan Klasnic gave relegation-threatened Bolton an 11 th minute lead against Manchester City.
Cash-rich City were struggling until Carlos Tevez drew them level in the 28th minute.
Bolton regained the lead with Gary Cahill's curling shot two minutes before the interval but there was still time for City's Micah Richards to make it 2-2 ahead of half-time.
Klasnic scored his second in the 53rd minute strike and things got worse for City when Craig Bellamy was sent-off for diving.
But City equalised when Tevez scored his second goal in the 77th minute.
The in-form Lee Bowyer scored Birmingham's winner in the 52nd minute and West Ham were reduced to 10 men when Mark Noble was sent-off.
Bobby Zamora put Fulham go 1-0 up in the 50th minute before Wade Elliott levelled for Burnley 10 minutes later.
Stoke goalkeeper Thomas Sorensen saved his third penalty in four games to ensure the Potters came away with a point
At White Hart Lane, Wolves clung on to a third-minute lead secured when Kevin Doyle turned in Nenad Milijas's free-kick