& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Asian markets tumble on fresh recovery fears

AFP, Hong Kong
Stocks tumbled in Asia Wednesday as economic recovery fears were stoked by Japan s downward revision of its latest growth figures and new debts woes in Dubai and Greece.
Tokyo fell 1.34 percent, Hong Kong 1.44 percent and
Sydney 0.70 percent.
TOKYO: Down 1.34 percent. The Nikkei-225 index fell 135.75 pointsto 10,004.72.
HONG KONG: Down 1.44 percent. The Hang Seng Index dropped 318.76 points to 21,741.76.
HSBC dropped 2.6 percent to 88.20 Hong Kong dollars and Standard Chartered shed 4.2 percent to 182.20.
SYDNEY: Down 0.70 percent. The S&P/ASX200 dropped
32.7 points to 4,637.9.
ANZ lost 1.92 percent to 21.51.
SHANGHAI. Down 1.73 percent. The Shanghai
Composite Index was down 57.10 points at 3,239.57.
All but ten of the 28 stocks on the ChiNext board rose.
SEOUL: Up 0.39 percent. The KOSPI gained 6.39 points at 1,634.17.
Samsung Electronics rose 0.8 percent to 778,000 won and LG Display added 2.6 percent to 35,550 won.
Hyundai Motor gained 3.3 percent to 108,500 won.
TAIPEI: Up 0.37 percent The weighted index rose 28.71 points to 7,797.42.
United Microelectronics Corp fell 1.53 percent to 16.1.
SINGAPORE: Down 0.30 percent. The Straits Times Index fell 8.29 points to 2,797.21.
BANGKOK: Down 0.59 percent. The Stock Exchange of T hailand lost 4.11 points to 694.71.
KUALA LUMPUR: Down 0.45 percent.The Kuala Lumpur
Composite Index lost 5.70 points to 1,255.76.
MANILA: Down 1.02 percent. The index dropped 30.82 points to close at 2,981.25.
WELLINGTON: Down 0.31 percent. The NZX- 50 index fell
9.66 points to 3,127.64.
MUMBAI. Down 0.59 percent. The 30-share Sensex closed down 102.46 points at 17,125.22.