& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

■ Khelaghar upset Gazi
form that took them to the semifinals of theT20 League earlier in the season.
After losing the toss, Gazi Tank were put in to bat and found going pretty hard
Khelaghar Samaj Kalyan Samity sprung a massive surprise in the Premier Division Cricket League when they trounced erratic Gazi Tank by five wickets at the BKSP Ground yesterday. Having registered their first points in only the previous round, Khelaghar took care of Gazi Tank in fine fashion as they chased down 248 runs in 49.1 overs with five wickets in hand to foil a wonderful knock of 128 not out from Gazi Tank batsman Shahriar Nafees. This loss puts Gazi Tank in a precarious position with possibility of losing out on super six berth.
, Surprise was the order of day, as powerful Kalabagan conceded a 107-run defeat to Old DOHS at the Fatullah stadium. Victoria remained in top six with a 99-run victory over bottom placed Partex courtesy of a fine hundred from opener Habibur Rahman. Cricket Coaching School beat BKSP by 73 runs to keep things tight for super six qualification.
Gazi Tank, smarting from their six-wicket defeat at the hands of Abahani in the last round, probably thought this tonight be an easy outing against a team who are only just beginning to get their • act together. But Khelaghar were deter-pined to capitalise on their regained
as they scored only 12 runs in 7.5 overs when the first wicket of Nazimuddin fell. The other opener Mithun, albeit pretty slow, built a partnership with Shahriar Nafees, but got out at the wrong time after scoring 29 leaving the score on 79 in 25.2 overs. Nafees found good company in Pakistani recruit Misbahul Haque. The two struck a 143-run partnership in good time to resurrect the innings and take them towards a big total. Misbah got out for 59 but Nafees held firm and stayed till the end scoring 128 off 130 balls to take Gazi’s total to 248 for four in fifty overs. Nafees's innings featured 4 sixes and 11 boundaries.
Chasing this big total, Khelaghar batsmen went for broke right from the start. Openers Rakib Mostafa perished cheaply, but the others stood firm and got runs as occasion demanded. Niaz Morshed stood out with his 97 from 114 deliveries, while Aslam Ali (50), Ashraf Ali (37) and Ashraful Nobi (28) chipped in with valuable contributions to coast their team home with 5 balls and 5 wickets to spare.
At Fatullah, Kalabagan conceded their second defeat in a row, third in nine matches, as they were thrashed by Old DOHS by 107 runs. Old DOHS batted first and put a challenging total of 225 for seven in their allotted fifty overs. The two openers Rumman Ahmed and
SEE PAGE 18 COL 2
FROM PAGE 17
Nasiruddin Faruk put on 124 for the first wicket in 31.3 overs. Rumman scored 62 while Faruk ended with 69. The latter batsmen chipped in with some quick runs to post 225 on the board. All rounder Nazmus Sadat was the most" successful bowler for Kalabagan with three wickets. Chasing this big target, Kalabagan struggled from the beginning against some fierce bowling from pacer Rubel Hossain, who ripped through the top order with three quick wickets including that of skipper Javed Omar (7). Mohammad Zahid (32) and Ariful Haque (22) tried their best, but they too failed to negotiate the other bowlers. Manosh Kundu finished with 3 for 10 to clip the lower order and get Kalabagn all out for a paltry 118 in 32.1 overs. Rubel’s outstanding figures read 4 for 26.
BRIEFSCORES GazlTankvs Khelaghar Gazi Tank: 248 for 4 in 50 overs (Nafees 128 not out, Misbahul Haque 59; Monirul Islam 1-35) Khelaghar: 249 for 5 in 49.1
overs (Niaz Morshed 97, Aslam Ali 50, Ashraf Ali 37; Forhad Reza 2-41)
Result: Khelaghar won by 5 wickets
Old DOHS vs Kalabagan
Old DOHS: 225 for 7 in 50 overs (Rumman Ahmed 62, Nasiruddin Faruk 69; Nazmus Sadat3-47)
Kalabagan: 118 all out in 32.1 overs (Mohammad Zahid 32, Ariful Haque 22; Rubel Hossain 4-26. Manosh Kundu 3-10)
Result: Old DOHS won by 107 runs
Victoria vs Partex
Victoria: 266 for 5 in 50 overs (Habibur Rahman 100, Arslan Mir 75; Rezaul Karim 2-48)
Partex: 167 all out in 48.5 overs (Oascoroni Ahmed 38, Jabid Hossain 30; Arslan Mir 2-19, Monir Hossain 2-21)
Result:Victoriawonby99runs CCSvsBKSP
CCS: 210 all out in 50 overs (Nizamuddin Ripon 96 not out, Tanvir Haider 2-34)
BKSP: 137 all out in 42.1 overs (Asif Ahmed 28, Ashiqul Alam 27; Refatuzzaman Ovi 4-17, Taposh Ghosh 4-33)
Result: CCS won by 73 runs