& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Kalabagan crush BKSP

Sports Reporter
Kalabagan Krira Chakra maintained their impressive run in the Premier Division Cricket League when they handed a 175-run defeat to BKSP at the Fatullah Cricket Stadium yesterday.
Kalabagan brightened their chance to book a place in the Super League with their sixth consecutive success following the all-winners Abahani and Mohammedan.
At the Sher-e-Bangla National Stadium in Mirpur, wickets stumbled like ninepins on a damp surface as Victoria Sporting Club posted a three-wicket victory over Old DOHS in the low-scoring match.
It was third win for Victoria while DOHS suffered their fourth defeat in seven matches.
The day's other match between Cricket Coaching School (CCS) and Khelaghar SKS was not held due to wet ground conditions at BKSP and the match will be played today at the Sher-e-Bangla National Stadium in Mirpur.
Kalabagan piled up 276 for 9 in their share of 50 overs and the innings was built around two half centuries from Golam Mabud (66 off 99balls) and Mohammad Zahid (60 off 68 balls).
But it was Ariful Haque who picked up the pace of the Kalabagan innings by hitting four sixes and two fours d u ring his 31 - ball 49.
New ball bowler Riaz Mahmud claimed three wickets for 50 runs.
BKSP had desperately needed a flying start but pacer Shahadat Hossain caused an early damage by picking up three wickets and the sports institute side could not recover from the early jolt as they were bundled out for 101 in 31.4 overs.
Left-arm spinner Enamul Haque, Nazmus Sadat and Rockybul Hasan took two wickets each.
At Mirpur, bowlers dictated the terms as Victoria shot their opponents out for 74 runs in 32.2 overs after Old DOHS decided to bat first.
Only two batsmen -Fazle Rabbi (20) and Taibur Rahman (24)—could manage double figures.
Arslan Mir, who later rescued his team with the bat also making team highest 21 runs, claimed three wickets for 26 runs while Abul Bashar took three for 10 runs.
Victoria also made a disastrous start and lost wickets at regular interval but Arafat Salahuddin kept his nerve during his unbeaten 24-ball 12 as Victoria reached the target scoring 77 for 7 in 29.4 overs.
SCORES IN BRIEF
KALABAGAN-BKSP
Venue: Fatullah
KALABAGAN: 276-9 in 50 overs (Sadat 26, Mabud 66, Rokibul 34, Zahid 60, Ariful 49, extras8; Riaz3-50, Mubarat 2-40,Tanvir2-49).
BKSP: 101 all out in 31.4 overs (Liton 22. Atiqur 34, extras 12; Shahadat 3-30, Enamul 2-19, Rockybul 2-10, Sadat 2-1).
Result: Kalabagan won by 175 runs.
VICTORIA-OLD DOHS
Venue: SBNCS
OLD DOHS: 74 all out in 32.2 overs (Rabbi 20, Taibur 24, extras 7; /Vafat 2-17, Arslan 3-35, Monir2-11, Bashar3-10).
VICTORIA: 77-7 in 29.4 overs (Kamrul 10, Arslan 21, Bashar 11, Arafat 12 not out, extras 10;Dollar2-15,Rubel2-26).
Result: Victoria won by three wickets.