& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Kiwis pegged back

AFP, Abu Dhabi
Off-spinner Saeed Ajmal took a career-best 4-33 to help Pakistan dismiss New Zealand for 211 in 46.3 overs in the third and final day-night international here on Monday.
The 32-year-old initially put brakes on New Zealand, who won the toss and batted, before triggering a middleorder collapse which saw seven wickets falling in the space of 47 runs.
Brendon McCullum, who scored a brilliant hundred in New Zealand's 64-run win in the second match on Friday, stood out once again with an aggressive 78-ball 76 which included three sixes and six boundaries.
Pakistan won the first match by 138 runs onTUesday.
New Zealand were well on course for a big score but once McCullum got out, caught and bowled by Shoaib Malik, Pakistani spinners led by Ajmal did not allow their rival's score to prosper.
New Zealand had raced to 72 by the 12th over, with McCullum hitting three sixes and six boundaries during his 47-ball half-century before the innings fell apart.
It was paceman Umar Gul who provided the breakthrough, removing opener Aaron Redmond caught off Mohammad Aamir for 21. This was Gul's 100th wicket in 67 one-day internationals.
Ajmal then came into his own, removing Martin Guptill (eight), Ross Taylor (44), Daniel Vettori (15) and Jacob Oram (two) to improve on his best one-day figures of 2-16 against the West Indies.
SCOREBOARD
Scoreboard of the New Zealand innings in the third one-day international against Pakistan at the Sheikh Zayed Stadium in Abu Dhabi on Monday:
NEW ZEALAND
McCullum c&b Malik 76
Redmond c Aamer b Gul 21
Guptill cYounusb Ajmal 8
Taylor lbwb Ajmal 44
Styrisrunout 14
Vettori lbwb Ajmal 15
Broom lbwb Afridi 0
Oram lbwb Ajmal 2
Mills c Ajmal b Aamer 4
Bondnotout 11
Southee c Razzaq b Aamer 4
Extras: (lb-6,w-6) 12
Total: (Ail out in 46.3 overs) 211 Fall of wickets: 1-72, 2-88, 3-138, 4-164, 5-187, 6-188, 7-190,8-194,9-198.
Bowler O M R W
Aamer 8.3 0 41 2
Gul 8 1 47 1
Razzaq 3 0 19 0
Ajmal 10 0 33 4
Afridi 10 0 33 1
Malik 7 0 32 1
PAKISTAN: Butt, Latif, Younus, Malik, Akmal, Afridi, Akmal, Razzaq, Gul, Aamer, Ajmal.