& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Pakistan pile up big total

AFP, Abu Dhabi
Shahid Afridi, Kamran Akmal and Khalid Latif hit half-centuries to help Pakistan reach 287-9 in the day-night first one-day international against New Zealand at Abu Dhabi Stadium here on Tuesday.
Dashing all-rounder Afridi hit a quickfire 50-ball 70 and opener Latif a snail-paced 64 to help Pakistan recover from a precarious 75-4 after Younus Khan won the toss and opted to bat on a flat pitch.
Akmal gave the innings final touches with a belligerent 43-ball 67 laced with four sixes and five boundaries as Pakistan ran rampage, collecting 107 in the last ten overs.
Afridi, vice-captain of the side, was instrumental in initially stepping up the runrate with his bold hitting as he smashed three sixes and four boundaries during his 30th half-century. He added 101 runs for the fifth wicket with Latif after New Zealand paceman Shane Bond dismissed opener Salman Butt and Younus -both without scoring -- in his incisive five-over spell.
Latif, who scored 19 in his only previous one-day in January last year, was also involved in a 57-run stand for the third wicket with Mohammad Yousuf, who shaped well for his 30 before being run out.
Afridi hit Vettori for a six before smashing two off successive deliveries off Nathan McCullum. He hit Bond for a straight drive to reach half-century off 36 deliveries, his first after 33 matches.
Afridi's last ODI fifty came against Zimbabwe at Multan last year.
Paceman Jacob Oram finally got Afridi off a miscued shot, caught at short fine-leg in the 39th over to break a repair-damaging partnership. Latif followed, bowled by Vettori's viscious arm ball two overslater.
Latif hit only two boundaries during his 112-ball knock. SCOREBOARD
Scoreboard of the Pakistan innings in the first day-night international against New Zealand at Abu Dhabi Stadium onTuesday: P/UGSTAN
Butt cB McCullum b Bond 0
LatifbVettori 64
YounuscB McCullum b Bond 0
Yousuf run out 30
U Akmal bVetto ri 9
Afridi c Butler b Oram 70 KAkmalnotout 67
RazzaqcStyrisb Butler 26 Gul run out 0
AamircB McCullum bSouthee 0 Ajmal not out 0
Extras: (lb-8,nb-2,w-ll) 21
Total: (For nine wkts in 50 overs) 287 Fall of wickets: 1-0, 2-0, 3-57, 4-57, 5-176, 6-184 , 7-270, 8-271,9-277.
Bowler O M R W
Bond 10 2 61 2
Southee 10 2 54 1
Butler 7 0 54 1
Oram 10 0 47 1
Vettori 10 1 34 2
N McCullum 3 0 29 0
NEW ZEALAND: B McCullum. Redmond, Guptill, Taylor, Styris, Oram. N McCullum. Southee, Bond, Butler.
Toss: Pakistan