& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Aus sneak into semis

India eliminated

AFP, Centurion
Australia o v e r-hauled a smallish
victory target of 206 with two wickets to spare off the last ball of the innings against Pakistan at the SuperSport Park in Centurion yesterday. The nail-biting win confirmed a semifinal spot for the men from Down Under and confirmed the exit of sub-continent giants India whose match against the West Indies turned into a dead-rubber down the road at the Wanderers. India were slowly but surely heading for victory after restricting a
depleted West Indies to 129. But the game lost its appeal when Australia won at SuperSports Park thanks to a last-ball bye.
The defending champions, having won the toss and restricted Pakistan to 205-6 off 50 overs, appeared to be coasting home with 140 runs on the board, eight wickets in hand and 112 balls to face.
But as the Pakistani bowlers led by Saeed Ajmal came alive, wickets tumbled and Australia entered the final over needing four runs to win a' match transformed into a thriller after being tedious to watch for so long.
Tail-enders Brett Lee and
Nathan Hauritz picked off singles against superb bowling from Umar Gul and tight fielding to reach 206-8 in the best match so far of the tournament
Man-of-the-match Michael Hussey top scored with 64 and ShaneWatson and Mitchell Johnson took two wickets each for the Australians, who face England Friday in the semifinals with Pakistan meeting New Zealand one day later.
"I was chewing my fingers off at the end," joked Autralia skipper Ricky Ponting. "Now we have to discover what went wrong in the second half of our inningsand fix it." Pakistan captain Younus Khan admitted he never expected such a tight finish: "We suddenly came good and took wickets. Some of our bowling was fantastic on a track that was a little soft but good."
Pakistan were never comfortable on a seam-friendly wicket and openers Kamran Akmal and Shahid Afridi compiled only 30 when the partnership was terminated on an overcast day.
Afridi was forced to play a pull off Mitchell Johnson and James Hopes covered ground quickly to take the catch as Pakistan struggled to match the form that reaped 302 runs against India last weekend.
Kamran also paid dearly for attempting a pull off Watson and the ball took a bottom edge into leg stump to leave Pakistan 75-2 approaching the 20-overmark.
It was lacklustre fare from teams who could meet again in the final with barely a murmur from the small crowd who braved cool conditions to watch the action.
Skipper Younus Khan was the third Pakistani victim and his innings summed up the lethargy that enveloped his team with 49 balls needed to garner an 18-run total that included just two fours.
Johnson joined the Australian 100 GDI wicket club with a soft one as Shoaib Malik attempted a drive only to send the ball straight to Ponting at short cover.
Mohammed Yousuf and Misbahu! Haq consolidated the innings with a 63-run fifth-
wicket stand before the former was caught by Cameroon White trying to steer a Brett Lee delivery over midwicket.
Misbah hit his wicket in the final over and the most unpredictable team in world cricket must have sensed they had not scored enough runs to avoid losing and slipping to second spot on the table.
After ducks against the Windies and India, Watson was desperate for runs and struck five boundaries in a brisk 24 before Gul deceived him and the ball edged to Kamran.
Fellow opener Tim Paine departed three overs later, trapped leg before by Afridi spin, then 'old hands' Ponting and Hussey added 81 runs for the third wicket.
Ponting made 32 off twice as many balls and managed just one boundary before a spectacular Gul catch off a Shoaib Malik delivery sent the Australian skipper back to the pavilion.
Replacement Callum Ferguson made just seven off 18 balls before he was bowled by Saeed Ajmal, whose low, swift delivery uprooted the middle and leg stumps.
A Rana Naved yorker proved the undoing of Ilussey, who could not gel his bat down sufficiently quickly and was bowled having faced 87 balls and scoring six fours and one six.
SCOREBOARD
Scoreboard of the (Shampions Trophy match between Australia and Pakistan at SuperSport Park on Wednesday:
PAKISTAN
Akmal c Watson 44
Afridi c Hopes b Johnson 15
Younusc Johnson b Hopes 18
MalikcPontingbJohnson 27
YousufcWhitebLee 45
Misbahul hit wicket b Watson 41
UmarAkmalnotout 2
Navedulnotout 7
Extras: (w-6) 6
Total: (For 6 wkts in 50 overs) 205
Fall of wickets: 1-30, 2-75. 3-89. 4-123.5-186.6-198 Did not bat. Umar Gul, Mohammad Asif and Saeed Ajmal.
Bowler O M R W
Lee 10 0 30 1
Siddle 5 0 24 0
Johnson 10 . 0 45 2
Watson 8 0 32 2
Hopes 10 0 50 1
Hauritz 7 1 24 0
AUSTRALIA
Watson c Akmal b Gul 24
Paine lbw b Afridi 29
Ponting c Gul b Malik 32
Hussey b Rana Naved 64
Ferguson b Ajmal 7
White b Asif 5
Hopes cYounus b Asif 1
Johnson b Ajmal 9
Leenot out 12
Hauritz not out 9
Extras: (b-l,w-l 2, nb-1) 14
Total (For 8 wkts in 50 overs) 206
Fall of wickets: 1-44, 2-59, 3-140.4-157,6-175,7 176,8-187 Did not bat: Peter Siddle Bowler O M R W
Gul 9 1 38 1
Asil 8 0 34 2
Afridi 10 0 47 1
Rana Naved 9 2 39 1
Ajmal 10 1 31 2
Shoaib 4 0 16 1
Result: Australia won by two wickets.
Man-of-the-match: Michael Hussey (AUS)