& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

IN BRIEF
Toni might seek move INTERNET, undated
Italy striker Luca Toni will consider leaving Bayern Munich ifhe doesn't become a regular starter again after a return from injury. Toni told Monday's edition of German sports magazine Kicker that he needs to play to keep his chances intact of representing his country at the 2010 World Cup.
Toni is set to return to training from Achilles tendon problems. But he could find it hard to make the starting lineup under coach Louis van Gaal, given the likes of Arjen Robben, Franck Ribery, Miroslav Klose, Ivica Olic and Mario Gomez on Munich's squad.
"Up to nowThe team was happy that I am here. If that is no longer the case I will consider a move," saidToni.
"If I have to take a place on the substitutes’ bench I will take this place. But 1 know my value and a lot of (other) clubs know my strength. So I will have to reconsider if I don't get a chance to play. After all, the World Cup is coming up."
Toni joined Munich in 2007 from Fiorentina and has scored 38 goals in 56 Bundesliga appearances for the German top club.
Mutu out for 10 days
AFP, Rome
Fiorentina's Romanian striker Adrian Mutu will be out for 10 days with a thigh injury, the Italian Serie A club said Monday.
Mutu, who missed his country's 1-1 draw with France on the weekend, will sit out Fiorentina's upcoming games against Cagliari in the Italian league and Lyon in the first round of Champions League action on September 16.
Footballer dies after scoring own goal
AFP, Prague
A 31-year-old footballer playing in a Czech regional league died of a heart attack during a game on Saturday shortly after scoring an owtj goal, the CTK news agency reported on Sunday.
Nine minutes into the game between two villages northwest of Prague, defender Michal Jezek slammed the ball into his owti net, then "collapsed on the pitch," CTK quoted another player as saying.
"He didn't seem to have a health problem at all," he added.
Doctors* summoned to the scene were unable to save him.
"He had a heart attack and unfortunately we w'ere-n't able to resuscitate him,” ambulance spokeswoman Tereza Janeckova told the idnes.cz website which said Jezek was married and left a six-month-old daughter.