& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

China okays single-dose flu vaccine

AP, Beijing
The answer may be at hand to a crucial question about vaccination for the advancing swine flu one shot or two? Chinese officials approved a vaccine Thursday that they say prevents the new flu in a single dose.
If they're right, it would be good news. Many health researchers fear it will take two shots to protect people, vastly complicating efforts to stem the spread of the illness.
The World Health Organisation says it is encouraged after reviewing the test
SEE PAGE 15 COL 7 FROM PAGE 1 details from the vaccine by Beijing-based drug maker Sinovac Biotech Ltd. one of several being developed in China. However, experts said more results are needed from other vaccine makers to determine if one dose would be potent enough.
Australia-based CSL should know within days whether one dose of its vaccine, administered to volunteers in that country in late July, was enough. CSLto date has been mum.
In about two weeks, the US expects to announce initial test results from its vaccine, which is the same type as one of the Chinese versions, said Dr. Anthony Fauci of the US National Institutes ofHeal th.
"From what I’ve seen and heard of the data, it looks encouraging," Fauci said of the clinical trials of Sinovac vaccine. "This is very good news. Let's hope the material that we're using has similar results."
Most experts agreed.
"Everybody is desperately hoping that one (shot) will do because then that's much easier to administer," said Jodie McVernon, a vaccine expert at the University of Melbourne who is involved in Australian trials of swine flu vaccines for young children. She had not seen the Chinese trial results.
However, James McGlothlin, a member of Purdue University’s pandemic planning committee, was cautious about the Chinese report.
"They've got some very good scientists over there, but anything that sounds too good to be true ought to be scrutinized," he said in a telephone interview.
"I'd like to look at some of the clinical trials," that led to the one-dose conclusion, he said. "In China, the rules are a little bit different in terms of human subjects," and it's not clear what safety factors were in place, he said.*
China's State Food and Drug Administration said Thursday it approved the vaccine by Sinovac, which completed testing last month.
The vaccine is the first to be approved by the Chinese regulator and is set to be followed by at least one other vaccine this week, made by Hualan Biological Engineering Inc. Another four vaccines were being reviewed, the regulator has said.
Both companies say their studies show one shot of vaccine is effective on people ages 3 to 60. More than 3,000 participated in the trials.
Sinovac says it has the capacity to produce up to 30 million doses of swine flu vaccine in a year, while Hualan said it can make 160 million doses.
Stockpiling vaccines is China's latest move in its aggressive approach to contain the spread of swine flu in the country of 1.3 billion people and relatively limited medical resources. It has quarantined travellers on suspicion of contact with infected people and ordered schools to test students' temperatures.
The Health Ministry says nearly 4,000 cases of swine flu have been confirmed on the mainland none fatal.
China aims to have enough swine flu vaccine for 5 percent of the public by the end of the year, and although health officials have not released detailed vaccination plans, they have said health workers, public service workers and students
are priority groups.
Should China export vaccines, however, quality concerns could arise.
Though China is a worldwide manufacturing centre for pharmaceuticals, suppliers have been known to substitute cheaper and sometimes lethal ingredients. Tainted cough syrup was linked to several deaths in Central America and blood thinners made with contaminated products are suspected in dozens of deaths in the US in recen t years.
Last week, Mexico's health secretary, Jose Angel Cordova, said Mexico is considering buying vaccines from China, which would be more than 40 percent cheaper than other vaccines being offered to the government. But Mexico would want a guarantee that China's vaccine is safe and effective, he said.
The World Health Organisation said information provided by Sinovac showed that in studies, the vaccines were tested in threa formulations of 15 micrograms per dose, and all gave antibody responses that satisfied regulatory criteria. That vaccine dose Is the same amount the US government is testing.
"We have no reason to doubt what Sinovac is reporting," said Melinda Henry, a WHO spokeswoman in Geneva. "Certainly if one dose proves sufficient to produce the desired immune response, this would be very encouraging in terms of augmenting the global supply of vaccine in the near future. ”