& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Messi steals the show

AFP, Monaco
Argentine superstar Lionel Messi lit up the European Super Cup on Friday as Champions League winners Barcelona defeated UEFA Cup holders Shakhtar Donetsk 1-0 after extra-time to claim the trophy.
Messi had the best opportunities in a disappointing match played on a cut-up, cabbagepatch of a pitch at the Stade Louis II and it was fining that he played the pivotal role in the night’s only goal.
With five minutes of extra-time left, and with a penalty shootout beckoning, Messi played a delightful one-two, between a line of defenders, with Pedro Rodriguez before the 22-year-old substitute slotted the ball past Andriy Pyatov in the Ukrainians' goal.
It was Barcelona's third SuperCup and already their second piece of silverware of the season having captured the Spanish Super Cup.
Barcelona coach Pep Guardiola hit out at the state of the pitch.
"It was unacceptable and unforgivable." said Guardiola. "We talk about the health of the players, protecting them and the spectacle, but on a pitch like that?"
Shakhtar coach Mircea Lucescu said his team had suffered at the hands of referee Frank DeBIeeckere.
"It's always difficult against Barcelona because the referee is always on their side,' said the Romanian.
"There was a penalty for us which wasn't
given and twice he whistled against us when we were on top. But apart from that, I congratulate Barcelona as they are a great team and deserved towin."
Barcelona, who face a major battle to hold on to their Spanish tide in the face of Real Madrid's chequebook power, were the better of the two sides throughout.
In a poor first-half, Thierry Henry flashed a shot over the crossbar of Pyatov while the Shakhtar goalkeeper was also quick to pull off a save, low down from Messi.
It wasn't until the 74th minute that a goal looked as if it might arrive.
Pyatov parried away a powerful drive from Messi and then back-pedalled smartly to tip over a clever chip from Henry.
Ten minutes from time, Barcelona newboy* Zlatan Ibrahimovic, who had struggled all night to make any sort of impression, was replaced by Pedro Rodriguez.
In a stormy conclusion to the 90 minutes, Messi and Olexandr Kucher were booked for squaring upto each other in the penalty area.
Shakhtar brought on striker Julius Aghahowa at the start of extra-time and he had his side's best chance 10 minutes later, bringing Victor Valdes's only meaningful save of the night.
Barcelona start the defence of their Spanish tide on Monday against Sporting Gijon and could have Shakhtar defender Dmytro Chygrynskiy in their starting line-up.
The 22-year-old had already become a Barcelona player before Friday s match but was allowed a farewell appearance alongside his Shakhtar teammates.