& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Kiwis cornered

AFP, Colombo
Left-arm spinner Rangana Herath grabbed four wickets as Sri Lanka pushed New Zealand towards a massive defeat in the second and final Test here on Saturday.
The Kiwis, battling for survival after being set an improbable victory target of 494 runs, slumped to 182-6 in their second knock by close of the fourtli day's play.
Daniel Flynn was the only top-order batsman to defy the Sri Lankan bowlers with 50, the left-hander's best performance in the series after scores of 14,0 and 13 in the previous three innings.
At stumps, Jacob Oram was unbeaten on seven and skipper Daniel Vettori was on five.
Sri Lanka won the first Test in Galle by 202
runs last week and a 2-0 sweep of the series will make them number two in the official Test rankings behind South Africa.
The hosts currently share the second spot with India.
New Zealand coach Andy Moles lashed out at his batsmen, saying watching them gift away their wickets was "very disappointing and very frustrating.”
Tn all honesty, we failed today," said Moles. "These are very talented cricketers but they make the same mistakes over and over again."
He said the wicket was spinner-friendly but that was no excuse for his six opening batsmen.
Earlier, Sri Lanka declared their second innings soon after lunch at 311-5, in which skipper Kumar Sangakkara scored 109 and former captain Mahela Jayawardene made 96.
Jayawardene, who hit 92 in the first innings, missed a century for the second time in the Test
FROM PAGE 17
when he edged Iain O'Brien to Taylor at first slip soon after lunch.
Sangakkara declared at the fall of Jayawardene's wicket, leaving his bowlers four-and-a-half sessions to bowl out the tourists.
Tim McIntosh and Martin Guptill put on 36 for the first wicket before both batsmen were dismissed in the space of five runs.
McIntosh, who plodded for 48 minutes to make seven, was bowled as he shouldered to a straight ball from fast bowler Dammika Prasad.
Guptill hit four boundaries in a fluent 28 when he edged the first ball from Herath to wicketkeeper Prasanna Jayawardene, and walked before the umpire raised his finger,
Ross Taylor and Flynn added 56 for the third wicket on either side of the tea interval when Herath had Taylor caught in the slips for 27 with a ball that spun sharply across the batsman.
Flynn, who batted for two hours to compile his fourth Test half-century, became Herath’s third victim when he played back to a straight ball, missed the line and was declared leg-before.
Brendon McCullum dragged a wide ball from Muttiah Muralidaran on to his off-stump after making 13 to leave New Zealand in deep trouble at 158-5.
Jesse Ryder propped up the total by making 38 before he was leg-before to Herath in the penultimate over of the day.
Earlier, Sangakkara's 20th Test century was his third this year and the sixth at his favourite hunting ground, the Sinhalese Sports Club.
He put on 173 for the third wicket with Jayawardene before being caught in the slips by Taylor offJeetan Patel.
The left-hander hit 12 boundaries and a six during his four-hour stay at the crease.
SCOREBOARD
Scoreboard at stumps on the fourth day of the second Test between Sri Irinka and New Zealand at the Sinhalese Sports Club ground in Colombo on Saturday:
SRI LANKA: First innings 416 (Samaraweera 143, M Jayawardene 92, Sangakkara 50; Patel 4-78, Vettori3-104) NEW ZEALAND: First innings 234 (Taylor 81; Herath 3-70, Muralidaran 3-71)
SRI LANKA: Second innings (overnight 157-2)
DilshancGuptillb Patel 33
Paranavitanac McCullum b Vettori 34 Sangakkara c Taylor b Patel 109 MJayawardenec Taylor b O'Brien 96 SamaraweeralbwbVettori 25
Kapugederanotout 7
Extras: (lb-l,w-2,nb-4) 7
Total: (For 5 wkts deci in 85.2 overs) 311
Fall of wickets: 1-56, 2-89, 3-262,4-301,5-311
Bowler O M R W
Vettori 24 4 62 2
O'Brien 15.2 1 77 1
Martin 9 0 34 0
Patel 34 2 122 2
Ryder 3 0 15 0
NEW ZEALAND: Second innings
McIntosh b Prasad 7
Guptill cP JayawardenebHerath 28
Flynn lbw b Herath 50
TaylorcMJayawardenebHerath 27
Ryder lbw b Herath 38 McCullum b Muralidaran 13
Oram not out 7
Vettori notout 5
Extras: (lb 6. nb-1) 7
Total: (For 6 wkts in 56 overs) 182 Fall of wickets: 1-36, 2-41, 3-97,4-131,5-158,6-176 To bat: Patel, O'Brien, Martin Bowler O M R W
Paranavitana 10 2 0 Thushara 14 1 39 0
Prasad 7 1 21 1
Herath 21 5 73 4
Muralidaran 12 0 39 1
Dilshan 10 2 0