& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Flintoff was fit?

AFP, Leeds
Andrew Flintoff declared himself fit before being left out by England ahead of their crushing fourth Test loss to Australia, the all-rounder's agent told Monday's edition of theTimes.
Andrew Chandler said team management were not satisfied that the fast bowler and hardhitting batsman, who has been struggling with a knee injury throughout what he has said will be his final Test series, would last the distance.
As it turned out, England were beaten inside three days at Headingley, losing by an innings and 80 runs as Australia levelled the Ashes at 1 -1.
Flintoff, 31 is due to see a knee specialist Monday as he bids to make the side for the fifth and final Test at The Oval, which starts on August 20.
But Chandler was adamant he could have played at Headingley.
"I've never seen anybody as low as Flintoff was on Thursday night when he was told he would not be selected," Chandler toldTheTimes.
"He told them that he was fit enough to get through, that he felt no different to how he felt at Edgbaston and that he could get through and do his bit. They didn't want him.
"He was prepared to do whatever it takes, was prepared to put whatever needed to be put into his knee.
"The whole point of announcing his retirement when he did was to clear his head and prepare to do whatever needed to be done to play the final Test matches of his career.
"He just didn't see it coming. He wanted to play and they didn't want him, and he didn't see that coming at all."
FlintofTs pace bowling led England to a 115-run victory in the secondTest at Lord's and topscored for the hosts in the drawn third Test at Edgbaston.
Chandler said England had failed to factor in the galvanising effect of match conditions on Flintoff after he was unable to convince team management of his fitness during nets sessions at Headingley.
"What they didn't take into account during Thursday's practice was that there was no adrenalin," he said.
"That was why he looked as though he was struggling so much and why he became so much worse on the final day at Edgbaston, when it was clear the game could not be won.
"He was hurting at Lord's but the adrenalin got him through. It would have got him through this week as well.
"His presence would certainly have lifted the crowd and the team, because without him they don't have much inspiration.'
Barring an announcement from the specialist that Flintoff needs an immediate operation, the star of England's 2005 Ashes series win is sure to come into consideration for a Test his side must win to regain the urn from Australia.
There were only three days between the end of the Edgbaston Test and Friday's start at Headingley and England captain Andrew Strauss hopes the next decision over Flintoff s availability will take place in calmer circumstances.
"We have to find out the fitness of Freddie and where he is at and then obviously the balance of the side is an issue as well," Strauss told
SEE PAGE 18 COL 3 FROM PAGE 17
reporters after stumps on Sunday.
"Hopefully we're in a better situation to get a result earlier for the final Test. On the back of Edgbaston it was impossible to know too far out from the last Test whether he would be fit enough and it was unfortunate he wasn't quite fit enough.
"It will involve constant monitoring from the medical team again about how he's feeling, his state of mind is going to be important as well, and hopefully we'll know two or three days out from the Test match whether he's fit enough to play or not."