& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Kevin, Colly
FROM PAGE 17
Left-hander Alastair Cook (10), playing loosely away from his body against Hilfenhaus, saw Hussey hold a diving one-handed chance in the gully.
Ravi Bopara was then hit second ball in the throat by lively first-change Peter Siddle, unlucky not to take a wicket, and he got off the mark thanks to a fortunate inside edge.
But Bopara, who'd scored hundreds in his last three Tests, all against the West Indies, did strike several elegant boundaries.
However, he was also hit on the head by a Mitchell Johnson bouncer.
England captain Andrew Strauss, who'd won the toss, looked secure while making 30. But it was the left-hander, not Bopara, who fell to a well-directed bouncer from Johnson which he gloved to Clarke in the slips.
And then Bopara's uneven innings of 35, featuring six fours, came to an end when he spooned a catch off Johnson to Phillip Hughes at point.
SCOREBOARD
Scoreboard at tea on the first day of the first Test between England and Australia at Sophia Gardens in Cardiff on Wednesday:
ENGLAND: First innings Strauss c Clarke b Johnson 30 Cook c Hussey b Hilfenhaus 10 Bopara c Hughes b Johnson 35 Pietersen not out 52
Collingwood not out 50
Extras: (b-8, lb-l,nb-8) 17
Total: (For 3 wkts in 59 overs) 194 To bat: Prior. Flintoff. Broad, Swann, Anderson, Panesar.
Fall of wickets: 1-21, 2-67, 3-90.
Bowler O M R W
Johnson 13 2 45 2
Hilfenhaus 12 3 27 1
Siddle 15 2 52 0
Hauritz 14 1 41 0
Clarke 5 0 20 0
AUSTRALIA: Hughes. Katich. Ponting. Clarke, Hussey, North, Haddin, Johnson, Hauritz, Siddle, Hilfenhaus.