& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Federer on the cusp of history

US's Andy through

AFP, London
Roger Federer reached a record 20th Grand Slam final and a seventh straight Wimbledon title match with a 7-6,7-5,6-3 win over German veteran Tommy
Haas in the semifinals on Friday.
Five-time Wimbledon champion Federer, who is chasing a record 15th Grand Slam crown, now tackles Andy Roddick of the United States in Sunday's final.
Roddick beat Andy Murray of Great Britain 6-4,4-6,7-6,7-6 to reach the final.
Watched by Grand Slam greats Bjorn Borg and Rod Laver, comfortably installed in the Royal Box, the world number two put on a magnificent show of serving against the German 31-year-old, not giving up a single break point.
"Tommy played great so I knew that there was a danger. I'm happy with my performance and it’s unbelievable to be in another final,” said Federer. "I have had a lot of pressure over the years but I am looking forward to another great match and a chance to get into the history books."
Federer said he was looking ahead to the challenge of the final.
"1 have had great matches with Roddick. You can never underestimate him with that serve," he said.
"Murray's at home. My record against him is not that good. He's shown over the last 18 months that he can be a Grand Slam contender."
The opening set on Friday was dominated by serve, but the Swiss second seed was the strongest in the tiebreak.
He went to three set points when Haas unleashed a loose forehand with the world number two wrapping up the set when the German, stranded behind the baseline, pushed a backhand into the net.
It was the dream start for the five-time champion after the nightmare beginning he suffered against the same opponent at the French Open last month when he had
to recover from losing the first two sets in the fourth round.
Former world number two Haas, playing in his first Wimbledon semifinal, had to save a set point, which was also the first break point of the match, at 4-5 in the second set.
But the Swiss broke through in the 12th game for a two-sets lead when another Haas forehand went long.
Haas cracked for the last time in the eighth game of the third set when he netted an easy approach having saved four break points.
Federer then wrapped up the semifinal in just over two hours on his first match point with a spectacular, athletic smash.
In Friday's second semifinal, third seed Murray will be looking to become the first British men's finalist since Bunny Austin in 1938. Fred Perry was the last British men's champion in 1936.
Roddick, the sixth seed and 2003 US Open winner, was runner-up here in 2004 and 2005, losing both finals to Federer.