& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Cahill sinks Japan

AFP, Melbourne
Tim Cahill scored twice as Australia came from behind to down Japan 2-1 and finish top of their Asian World Cup quali-fying group here on Wednesday.
The mercurial Everton midfielder popped up for his brace after Australia had conceded their first goal in eight qualifiers to keep the team unbeaten as they head to South Africa along with Japan for next year's World Cup finals.
Cahill scored in the 59th and 76th minutes to continue his 'lucky charm' effect on the Socceroos and conjure memories of his late double when Australia came from behind to beat Japan 3-1 at the 2006 World Cup in Germany.
Cahillnowhas 16goals in 33 internationals.
Australia finished Group A with 20 points and inflicted Asian rival Japan's first defeat in 11 qualifiers this campaign.
Japan last lost 1 -0 to Bahrain in Manama on March 26 last year.
But for a time it looked as though Japan would register a prestige win in front of almost 70,000 people at the Melbourne Cricket Ground.
Japan's Brazilian-born defender Tulio broke the deadlock and ended Australian goalkeeper Mark Schwarzer's seven-match run of clean sheets with a headed goal in the 40th minute.
Tulio got above Nicky Carle and rammed home Kengo Nakamura's corner to stunned silence from the Australian crowd.
It was the first goal Australia have conceded in their eight qualifiers since a 1 -0 loss to China in Sydney a year ago.
Japan almost grabbed a second goal right on halftime when Keiji Tamada's free kick just outside the box was headed off the line by Socceroos' skipper Lucas Neill.
But Cahill proved Australia's hero with a trademark header 15 minutes after halftime.
Cahill and giant striker Josh Kennedy both climbed for Vince Grella's lofted free kick but the diminutive Everton midfielder got his head to the ball first and arced it beyond goalkeeper Seigo Narazaki into the far top corner.
His goal energised the Socceroos and they had a lively spell at the Japanese goal.
Cahill scored his second 14 minutes from time when he volleyed home Carle's corner from close range.
Australia fielded just three survivors --Schwarzer, Jason Culina and Mile Sterjovski — from last week's 2-0 win over Bahrain in Sydney, while Japan had seven members of the team who started in the 1-1 draw with Qatar in Yokohama.
The Socceroos went in with two inexperienced wide defenders, leftback Shane Stefanutto (1 cap) and debutant Rhys Williams on the right.