& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Indoor air pollution 4th leading risk factor for diseases

Speakers tell workshop

Staff Correspondent
Health and Family Welfare Minister Prof AFM Ruhal Haque has said necessary measures will be taken to reduce indoor air pollution (IAP) to minimise its dire impact on human body, preserve ecosystem and mitigate global warming.
He was speaking at the inaugural session of a workshop titled Indoor Air Pollution' organised jointly by the World Health Organisation (WHO) and GTZ, a German agency for technical cooperation, at a city hotel yesterday.
“We have to take measures to mitigate climate change for our survival, and to preserve our local ecosystems by ensuring maximum utilisation of our natural resources," the minister said.
Presenting the keynote paper Dr Joseph H Graziano, professor of । Erwiromnent Health Science at Columbia University, said cooking by burning bio-mass like charcoal, wood, agricultural residue and cow dung is primarily responsible for IAP
At least 20 percent of global warming is caused by LAP, he said, adding that it doubles the risk of pneumonia, tuberculosis, asthma, cardiovascular diseases, low birth weight and prenatal health outcomes.
Dr Joseph said it has been estimated that in developing countries IAP is the fourth leading risk factor contributing to various diseases.
“In the urban as well as rural areas of Bangladesh, the level of indoor air pollution is higher than outdoor air pollution,” headded.
Dr Joseph said GTZ has promoted an improved stove to reduce indoor air pollution and its associated health impacts at the household levels
A better ventilation, which has been set in the improved stoves, is the replace-
ment of traditional three-stone or shielded open-fire cooking, he added.
Dr Joseph said the improved stoves are mainly developed by the Institute of Fuel Research and Development of Bangladesh Council of Scientific and Industrial Research and further improved by its partner organisation GTZ.
To date more than 1000 young women and men have been trained, who have constructed over 1,40,000 stoves in the country under the supervision of GTZ, he added.
He also laid emphasis on creating mass awareness about the health damage caused by IAP and encouraging people to take preventive measure in this regard.
Dr Andrew Trevett, acting WHO representative to Bangladesh, Otto Gomm, programme coordinator of GTZ, and Sheikh Altaf Hossain, secretary to health and family welfare ministry were present at the workshop. ,