& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

South Africa level 1 -1

AFP, Centurion
Opening bowlers Dale Steyn and Wayne Parnell produced devastating performances as South Africa bounced back with a convincing sevenwicket victory in the second one-day international against Australia at Centurion Park here on Sunday.
Australia were bowled out for 131 after their top order batsmen were blown away by Steyn and the teenaged Parnell.
South Africa needed just 26.2 overs to level the five-match series after being beaten by 141 runs in the opening clash in Durban on Friday.
Australia crashed to 19 for five before Callum Ferguson led a partial recovery, making 50.
Steyn took four for 27 and the left-armed Parnell, 19, claimed four for 25 in his second one-day international.
Steyn started the slide when he bowled Brad Haddin off an inside edge with the sixth ball of the match.
Australian captain Ricky Ponting hit the first ball he faced from Steyn for six but made only two more runs before edging a drive against Parnell to wicketkeeper Mark Boucher.
Man-of-the-match Parnell dismissed Michael Clarke and Mike Hussey leg before wicket with full deliveries that swung late and had figures of three for three after four overs, while Steyn had David Hussey caught behind
Ferguson and Mitchell Johnson put on 63 off 107 balls for the seventh wicket in the only substantial partnership of the innings before Johnson was deceived by a doosra from off-spinner Johan Botha.
Ferguson made 50 off 83 balls before falling to a vicious lifter from Steyn in the fast bowler's second spell, gloving a catch to backward point.
Ponting won the toss and batted on a hard. almost grassless pitch that looked ideal for batting. But the Australian batsmen were undone by the pace and swing generated by Steyn and Parnell.
Herschelle Gibbs fell early to Johnson but South African captain Graeme Smith and Jacques Kallis put on 69 for the second wicket to take their team more than half way to the target.
Needing wickets to have any chance of salvaging the match, Ponting bowled out Johnson, his main strike bowler, inside the first 22 overs. Johnson took two for 47 in his 10 overs.
Parnell, who was awarded a contract by Cricket South Africa last week, was one of three changes in the South African team. Kallis returned after a groin injury and leftarm slow bowler Roelof van der Merwe was given a first one-day international cap.
Hashim Amla, Morne Morkel and Makhaya Ntini were left out.
SCOREBOARD
Scoreboard in the second one-day international between South Africa and Australia at Centurion Park on Sunday: AUSTRALIA
Haddinb Steyn 1
Clarke lbw b Parnell 5 Ponting c Boucher b Parnell 8 Hussey c Boucher b Steyn 1 Hussey lbw b Parnell 3 Ferguson c De Villiers b Steyn 50 Hopes c Botha b Kallis 8 Johnson lbw b Botha 30 Hauritzc Boucher b Steyn 10 Bracken c Gibbs b Parnell 5 Laughlin not out 1
Extras: (lb-2, nb-l,w-6) 9
Total: (All out in 40.2 overs) 131 Fall of wickets: 1-2, 2-11,3-14, 4-19, 5-19, 6-40, 7-103, 8-124, 9-129.
Bowler O M R W
Steyn 9.2 0 27 4
Parnell 8 3 25 4
Kallis 4 0 11 1
A Morkel 5 0 15 0
Botha 9 0 29 1
VanderMerwe5 0 22 0
SOUTH AFRICA
Smith c Clarke b Laughlin 40 Gibbs cHauritzb Johnson 2 Kallis c Haddinb Johnson 31 de Villiers notout 36
Duminynotout 11
Extras: (lb-6,w-6) 12
Total: (For3wkts in 26.2 overs) 132 Did not bat: Boucher, A Morkel, Van der Merwe, Botha, Parnell, Steyn.
Fall of wickets: 1-7,2-76,3-93.
Bowler O M R W
Johnson 10 0 47 2
Bracken 4 0 23 0
Laughlin 7.2 1 30 1
Hauritz 5 0 26 0
Result: South Africa won by 7 wickets.
Man-of-the-match: Wayne Parnell.
Umpires: Asoka de Silva (SRI), Brian Jerling(RSA).
Match referee: Ranjan Madugalle (SRI)