& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Fire safety laws enough, enforcement missing

The Daily Star-IAB roundtable told

TAWFIQUE All and HELEMUL Al AM
Slack enforcement of existing laws and lack of public awareness make any multistoried building vulnerable to fires, ren-dering life and property unsafe, said experts at a roundtable on "Fire Safety in Our Buildings" yesterday.
Noted architects, structural engineers and high-ranking government officials took part in the discussion jointly organised by the Institute of Architects Bangladesh (LAB) and The Daily Star at the latter's conference room.
‘There are adequate laws and code on fire prevention and safety measures,” said Chief Architect of public works ministry 's architecture department ASM Ismail, adding, "What we lack is implementation."
Bangladesh National Building Code (BNBC), 1993, made legally binding in 2006, has a detailed chapter on fire protection measures. Construction of any building must follow this code.
Prof Jamilur Reza Chowdhury, an eminent structural engineer, said structural design of a building is supposed to ensure inherently a minimum fire rating with low flammable construction materials and emergency exits.
The very spirit of fire safety should be safety of life, said architect Bashirul Huq, "We need to contain the fire at the source. Most dangerous element of fire is smoke that takes lives."
As per Fire Prevention and Dousing Act. 2003, Fire Service and Civil Defence authorities are empowered to inspect any building and check their compliance with the required fire-safety provisions.
In case of non-compliance or negligence, they can notify the building owner for rectification or declare the building unsafe for public use.
Unfortunately, there has been no such instance of declaring a building unsafe in the six years since the law was enacted, the speakers said. Director General (DG) of Fire Service and Civil Defence Directorate Brig Gen Abu Nayeem Md Shahidullah said such actions against non-compliance are underway.
Pointing out various inadequacies in his directorate the DG said there are only 50 fire inspectors in the country and 15 of them are in the capita) where there are only 13 fire stations with 11 set up before the independence.
"The allocation we have for public awareness campaigns isTk 1 to 1.5 lakh a year," said Nayeem.
He said out of 9,310 fire incidents in 2008, 39 percent occurred due to electric short circuits, 23 percent due to open burners (including gas), nine percent caused by cigarettes, five percent by mosquito coils, wick lamps and candles and 2.5 percent fires were caused by children playing with fire.
Kazi Golam Nasir, deputy chief architect of the public works ministry's architecture department, said all the relevant laws have to be integrated with Building Construction Act, 1952. He demanded that fire-safety rules be put under Fire Prevention and Dousing Act after consultation with professionals.
"An integrated set of rules is crucial to address the firesafety situation," said Nasir.
The BNBC is legally binding for building construction, said Zoinal Abedin, member (planning) of Rajdhani Un nay an Kartripakkha (Rajuk). It contains detailed provisions on fire-safety measures in a building, tire member added.
Architect Khandaker Tazuddin emphasised the need for builders' complying with the electrical code incorporated in the BNBC to prevent short-circuit fires.
LAB President Mubasshar I lussain said the underground Titas Gas supply network is maintained in such a manner that a pipe explosion, caused by an earthquake, could claim thousands oflives.
Life, property and neighbourhood hazards should be the foremost concerns in a building design, said architect Prof Nizam uddin Ahmed
Use of electric multi-plugs is one of the prime causes of fire, according to fire fighting system engineer Manash Kumar Mitra.
Fire-fighting systems in existing buildings should be rectified, said Tanvirul Huq Probal, president of Real Estate and Housing Association of Bangladesh (Rehab).
To this day, reasons behind most of the fire incidents remain unearthed, said KM Mohammad Foyez Ullah, an ‘ architect of Bashundhara City Complex.
Urban planners and authorities concerned must retain ponds and lakes for water sources in the capital, said former president of Rehab Abdul Awal.
The Daily Star Editor Mahfuz Anam, who moderated the discussion, called upon the fire service authorities to be more up and doing to enforce relevant laws and ensure fire-safety standards.
Architects KM Mustapha Khalid, Zakiul Islam and Fire Service Deputy Director Sheikh Md Mizanur Rahman spoke among others. Environmentalist Prof Abdullah Abu Sayeed and The Daily Star Managing Editor Syed Fahim Munaim were also present.
Experts' recommendations:
• Integration of all the related laws, rules and codes.
• Any building irrespective of height must have workable fire-safety arrangements.
• Change people’s mindset.
• Fire Brigade should have engineering and investigation wings.
• Mandatory fire hazard insurance.
• Electrical wiring has to be in compliance with the national electrical code.
• Avoiding highly flammable construction materials.
• Single-riser gas-supply line at buildings.
• Strengthening the Fire Service and Civil Defence Directorate.
• Rectification of buildings built before Fire Prevention and Dousing Act, 2003, and Building Construction Rules, 2006.
• Wasa and DCC should install hydrant points at public places.
• Fire extinguishers and refilling stations must be made easy to find.
• Mandatory fireproof door for kitchens, smoke detectors and alarm bells for residences.
• Fire exits in all buildings.
• Regular (quarterly) fire drills at all buildings.
• Specialised fire-protection engineering course at uni versify level.
• Compensation for death in fire at commercial buildings.
• Forming a volunteers' pool of fire fighters.
• Larger role of the media for building public awareness.