& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Strauss ton goes awry

West Indies level 1-1

AFP, Providence
Andrew Strauss hit his third one-day international hundred, but England still went down to a 21 -run defeat at the hands of the West Indies at the Guyana National Stadium on Sunday.
The captain made 105 from 129 balls as England, chasing 265 for victory, were dismissed for 243 in 48.2 overs to allow West Indies todrawlcvclat 1-1 in the five-match series.
The third and fourth matches will be contested at Kensington Oval in Barbados on Friday and Sunday, with the final game set for St. Lucia on April 6.
England had won the opener here on Friday when West Indies coach John Dyson embarrassingly miscalculated the Duckworth-Lewis method and handed his opponents a one-run win.
"We lost too many wickets too early and we were always behind the eight ball," admitted Strauss.
"We needed tilings to go our way in the last powerplay but with the medium pacers bowling. it wasn't easy to get the ball away. It was getting lower and slower, so we had to take risks to get runs.
It would have been nice to have gone 2-0 in the series, but we have a good chance of winning in Barbados where the wicket might suit us better. "
West Indies skipper Chris Gayle said his team had a point to prove.
"We were really down after what happened on Friday," said Gayle. "We wanted to give the crowd something to cheer about and 1 want to commend the guys for the way they played."
Man-of-the-match Shivnarine Chanderpaul scored his 10th one-day hundred of 112 not out from 134 balls to lead West Indies to 264 for eight from their 50 overs.
Strauss reached his hundred from 126 balls with a drive through cover for two off Kieron Pollard, but England lost wickets steadily.
Their best stands were 50 between Strauss and Owais Shah for the third wicket, and 59 between the England captain and Dmitri Mascarenhas for the sixth.
Mascarenhas made 29 and Shah made 22 and were the only other batsmen that passed 20. Dwayne Bravo and Pollard both collected two wickets for West Indies.
Earlier, England, particularly Paul Collingwood and Mascarenhas, bowling their modest medium-pace, restricted West Indies to 57 runs in the last 10 overs and collected four cheap wickets to scupper the home team's hunt for quick late runs.
The tourists had been under pressure from Chanderpaul and coinpatriot Ramnaresh Sarwan when they put on 133 from 177 balls for the third wicket, after West Indies elected to bat and lost Lendl Simmons for a duck and fellow
FROM PAGE 17
opener Gayle, for 20, inside the first six overs.
Urged on by the largest crowd for an international match in Guyana, Chanderpaul and Sarwan hit 74 from 89 balls.
But James Anderson had Sarwan caught at deep mid-off in the 35th over, and Collingwood and Mascarenhas prevailed in the closing overs to limit the damage of the West Indies batsmen.
Anderson captured three for 37 from nine overs, Collingwood took three for 49 from 10 overs, and Dimitri Mascarenhas bagged two for 53 from 10 overs.
SCOREBOARD
Final scoreboard of the second one-day international between West Indies and England at the Providence Stadium in Guyana on Sunday:
WEST INDIES
Gayle b Anderson 20
Simmons c Prior b Anderson 0
Sarwan c Collingwood b Anderson 74
Chanderpaul notout 112
Pollard c Pietersen b Mascarenhas 8
Bravo c Collingwood b Mascarenhas 19
Ramdin cHarmisonb Collingwood 1
Sammy lbw b Collingwood 11
Miller b Collingwood 0
Edwards not out 3
Extras: (b-2,lb-6,w-7,nb-l)16
Total: (For 8 wkts in 50 overs) 264
Did not bat: Baker.
Fall of wickets: 1-15, 2-24, 3-157, 4-206, 5-237, 6-238, 7-256,8-256.
Bowler O M It W
Broad 7 0 48 0
Anderson 9 1 37 3
Harmison 7 0 29 0
Batty 6 0 38 0
Mascarenhas 10 0 53 2
Collingwood 10 0 49 3
Bopara 10 2 0
ENGLAND
Strauss b Pollard 105
Bopara b Baker 14
Pietersen b Edwards 12
Shah lbw b Bravo 22
Collingwood b Bravo 1 Priorc Ramdin b Sammy 2 Mascarenhas run out 29 Broad c&b Miller 3
Batty run out 5
Harmison not out 18
Anderson b Pollard 8
Extras: (b-1, lb-ll,w-12) 24
Total: (All out in 48.2 overs)243 Fall of wickets: 1-18, 2-36, 3-86,4-88,5-97, 6-156,7-168.8-185,9-195,10-243.
Bowler O M R W
Baker 6 0 31 1
Edwards 6 0 31 1
Bravo 9 0 40 2
Sammy 10 1 36 1
Miller 9 0 42 1
Pollard 7.2 0 46 2
Gayle 10 5 0
Result: West Indies won by 21 runs.
M a n - o f - t h e - m a t c h : Shivnarine Chanderpaul.
Toss: West Indies
Umpires: Alcem Dar (PAK) and Clyde Duncan (W1S) Match referee: J a v a g a I Srinath(lND)