& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Strauss puts Eng in charge

AFP, Port Of Spain
Andrew Strauss batted the entire day to reach his third hundred of the series, and lead another solid England batting performance in the fifth and final Test against West Indies on Friday.
The England captain was undefeated on 139 - his 17th Test hundred - and shared century partnerships with Owais Shah and Paul Collingwood to guide England to a respectable 258 for two when stumps were drawn on the opening day at Queen’s Park Oval.
Strauss won the toss and chose to bat on another hard, true Caribbean pitch under
sunny skies, and used the conditions to fashion another hundred to follow scores of 169, 14, 142, and 38 in his four previous innings.
"It's been a nice little purple patch for me," said Strauss. "When you are in form you've got to cash in. Thankfully I was able to do that today.
T feel I am concentrating well and playing the balls on their merit. Long may it continue."
The left-hander added 107 for the second wicket with Shah before his Middlesex teammate was forced to retire hurt on 29 with severe cramps in his left-hand.
Strauss reached his milestone from 186 balls, when he drove West Indies captain Chris Gayle, plying his uncomplicated off-spin, through cover for a single about 20 minutes after tea.
FROM PAGE 17
After a brief appearance from Kevin Pietersen ended in the final over before tea, Collingwood joined Strauss and batted through the entire evening period to add 102 for the third wicket and was unbeaten on 54 at stumps.
Collingwood reached his 50 from 108 balls in the final hour, when he dabbed Fidel Edwards into backward point forasingle.
England had made steady progress in an uneventful morning period to reach 74 for oneatlunch.
The visitors suffered a setback when Alastair Cook was caught behind for 12 off Daren Powell in the first hour of the day.
But Strauss found Shah a steady ally before lunch, although the England No.3 took close to three quarters-of-an-hour to gel his first run.
After lunch, Strauss inched to within sight of his hundred, but Shah's battle with cramp and the wicket of Pietersen frustrated his efforts to get England moving, as they reached 156 for two at the break
There was a close call for Strauss, on 47, when he attempted to steal a single to second slip fielder Devon Smith off Brendan Nash and
was fortunate to have regained his ground.
He eventually reached his 50 from 118 balls, when he tugged Gayle to mid-on for a single.
Strauss and Shah were putting the grind on West Indies, when the England No.3 was overcome with cramps, and had to leave the field with the visitors on 133 for one.
Pietersen has not been at his fluent best in the series, and Ryan I finds, delivering his left-arm spin from around the wicket, bowled him for 10 with a delivery that pitched on the line of middle stump and spun across the batsman to hit off-stump in the final over before lunch.
England made three changes to their side with Matt Prior, debutant Amjad Khan, and Monty Panesar replacing Tim Ambrose, Ravi Bopara, and Ryan Sidebottom.
West Indies made two changes, bringing Lendl Simmons and Lionel Baker in to replace specialist spinner Sulieman Benn and Jerome Taylor, who has an injured left ankle.
England trail in the five-Test series 1-0, following an innings and 23-run defeat in the opening Test at Sabina Park in Jamaica, where they were dismissed for their third-
lowesttotalof51 in the second innings.
The second Test at the Vivian Richards Cricket Ground in Antigua was abandoned because of a dangerous outfield, while the third Test at the Antigua Recreation Ground and the fourth Test at Kensington Oval in Barbados both ended in draws.
SCOREBOARD
Scoreboard at stumps on the first day of the fifth and final Test between West Indies and England at Queen's Park Oval on Friday:
ENGLAND: First innings Strauss not out 139
Cooke RamdinbPowell 12
Shah retired hurt 29
Pietersen b Hinds 10
Collingwood not out 54
Extras: (lb-4,w-l, nb-9) 14
Total (For 2 wkts in 90 overs) 258
Io bat: Prior. Broad, Swann, Anderson, A. Khan, Panesar.
Fall of wickets: 1-26,2-156.
Bowler OMR W Edwards 14 2 25 0
Powell 11 1 51 1
Baker 12 2 30 0
Nash 16 3 47 0
Gayle 17 0 52 0
Hinds 20 2 49 1
WEST INDIES: Gayle. Smith, S a r w a n , Simmons, Chanderpaul, Nash, Hinds, Ramdin. Powell, Edwards, Baker.
Toss: England