& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Unfinished business

Sports Reporter
All three Premier Division Cricket League matches stopped midway due to the daylong crisis at BDR headquarters yesterday.
The Cricket Committee of Dhaka Metropolis (CCDM) decided to continue the matches today from yesterday's position and the league will be bodily-shifted.
League leaders Biman were well placed while second-placed Abahani and Surjo Torun had been in control before the proceedings were suspended at three different venues in Dhaka and its suburban areas.
At the Sher-e-Bangla National Stadium in Mirpur, Nadim Karamat made 70 runs as winless City Club put up a descent total of 236 for nine after being sent into bat first.
After a good start by Rasel Al Mamun and .Mayshekur Rahman, who shared a 50-run opening stand, Nadim took the charge before
he was caught by Javed Omar off Zahid Niaz, who was the most successful bowler with four wickets for 39 runs.
Nadim struck nine boundaries and a six during his 76-ball essay while Lalmon Hossain hit unbeaten 28 off 22 balls that contained three boundaries.
In reply, Biman scored 41 runs without any loss in 8 overs with Nazmus Sadat batting on 24 and Zahid Niaz at 14.
Abahani missed the services of their inspirational captain Mashrafe Bin Mortaza, who was given rest on national physio Michael Henry's advise, in their attempt to overcome the hurdle against Old DOHS but a 136-run third wicket stand between Imran Ahmed and Indian Venugopal Rao put them into a comfortable position as they made 290 runs for seven at the Fatullah Cricket Stadium.
Imran, who hit a hundred in the last round against Victoria, carried his good form with a 107-ball 70 that featured six boundaries while Venugopal contributed 77 off 82 balls with the help of seven fours and a six.
Wicketkeeper-batsman Sahagir Hossain (39) and Nasir Hossain (42 not out) played vital knocks to accelerate the run rate.
Pacer Abul Hasan captured three wickets for 49 runs in 10 overs.
In reply, DOHS started cautiously by making 33 runs in 9 overs without any loss.
At BKSP in Savar, Mohammedan suffered a batting debacle as they were bundled out for 159 runs after being sent into batfirst.
Captain Sohrawordi Shuvo hit team highest 38 and Marshal Ayub added 28.
Saiful Islam claimed three wickets for 22 runs and Saqlian Sajib took three wickets for 22 runs.
hi reply, Surjo Tonin lost one wicket for 31 runs in 7 overs.