& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Younis falls short

Exciting draw at Karachi

AFP, Karachi
Younis Khan failed to post the highest Test score by a Pakistani batsman as the first Test against Sri Lanka ended in a draw, after some late excitement raised hopes of an unlikely result
Khan fell for 313,24 short of Hanif Mohammad's record score of 337, but the home team still achieved their high-estTest innings score of765-6.
Sri Lanka had declared their first innings at 644-7.
After Younis's dismissal leg-spinner Danish Kaneria sparked late interest in a game
heading for a draw when he claimed the wickets of Sri Lankan captain Mahela Jayawardene (22) and Kumar Sangakkara (65) in the space of four overs.
But Thilan Samaraweera (24) and Prasanna Jayawardene (seven) played out seven overs to take their team to 144-5 and thwart Pakistan's attempts of an unlikelywin.
The second and final Test starts in Lahore Sunday.
Younis said he did not feel disappointed at not breaking records.
"I am not heartbroken," said Younis. "I may have more opportunities in the future so records don't matter for me. I am satisfied with the team
effort and will go Into the second Test, hoping Sri Lanka struggle like they did today.”
Jayawardene was also satisfied with the result.
'You always want to play well in the first Test of a two-match series," said Jayawardene, who scored 241 and shared a world record stand of 437 with Thilan Samaraweera (231) in his team's first innings.
"We batted badly in the second innings but overall it was a satisfying result. We had our opportunities but Younis played a brilliant knock and took away our chances."
Trailing by 121 runs, Sri Lanka had a disastrous start to their second innings as they lost opener Malinda Warnapura (two), caught behind off paceman Umar Gul in the first over.
Gul then had Tillakaratne Dilshan (eight) caught off a mistimed pull. In between Gul's double strike, opener Tharanga Paranavitana was run out when he failed to beat Yasir Arafat's direct throw while taking a single.
Paranavitana, who fell for a duck in the first innings, managed just nine to cap a miserable Test debut.
It was also a setback for 31 -year-old Younis, Pakistan's new captain, who had set his sights both on Hanif s record for Pakistan and West Indies Brian Lara's world record score of400.
Younis, who resumed at 306, played on to Sri Lanka's Dilhara Fernando in the ninth over of the day, to the disappointment of a sparse crowd at the National Stadium hoping to see him break Lara's record, set against England in 2004.
Hanif’s Pakistani record was set against the West Indies in Barbados in 1958.
Kamran Akmal notched a fiery career-best 158 as Pakistan improved on their previous best Test innings total of 708, made against England atTheOvalin 1987.
The home team’s total of 765 runs also becomes the highest innings total in a Test in Pakistan, overtaking the 699-5 by Pakistan against India at Lahore in 1989.
Younis, who came to the crease on Sunday, batted for a marathon 12 hours and 48 minutes, facing 568 balls and hitting 27 boundaries and four sixes.
His triple ton eclipsed Sri Lankan skipper Mahela Jayawardene's 240, part of a
record 437 fourth-wicket stand with Thilan Samaraweera (231).
Akmal, 27, completed his 2,000 runs when he was on 56. He hit five sixes and eight boundaries. Arafat finished with 50 not out and put on 169 quick runs for the seventh wicket with Akmal.
SCOREBOARD
Final scoreboard of the first Test between Pakistan and Sri Lanka on the fifth and final day at the National Stadium in Karachi on Wednesday:
SRI LANKA: First innings 644-7 declared (M Jayawardene
240, Samaraweera 231, Sangakkara 70, Warnapura 59; Kaneria 3-170)
PAKISTAN: First innings (overnight 574-5) Manzoor cP Jayawardene b Mendis 27
Butt c M Jayawardene b Muralidarari 23
Younis Khan b Fernando 313 Malikrunout 56
Misbahul lbw b Fernando 42 Iqbal lbw bM Jayawardene 57 Akmal not out 158
Arafat not out 50
Extras: (b-5,lb-11,nt>-18, w-5) 39
Total: (Forsixwkts deci in
248.5 overs) 765
Fall of wickets: 1-44, 2-78, 3-227,4-357,5-531,6-596.
Bowler O M R W
Vaas 36 10 66 0
Fernando 39 2 124 2
Mendis 59 14 157 1
Muralidaran 65 14 172 1
Dilshan 19 3 82 0
Paranavitana 5 0 33 0
Sangakkara 10 0 34 0
M Jayawardene6.5 0 41 1
Warnapura 9 0 40 0
SRI LANKA: Second innings Paranavitana run out 9 Warnapura c Akmal b Gul 2 Sangakkara lbw b Kaneria 65 Dilshan c Iqbal b Gul 8 M Jayawardene c Iqbal b Kaneria 22 Samaraweera not out 24 P Jayawardene not out 7 Extras: (nb-7) 7
Total: (For five wkts in 31 overs) 144 Did not bat: Vaas, Fernando, Mendis, Muralidaran.
Fall of wickets: 1-2, 2-32, 3-45, 4-103,5-120.
Bowler O M R W
Gul 9 1 41 2
Sohail 6 0 33 0
Arafat 6 0 32 0
Kaneria 9 1 35 2
Malik 10 3 0
Result: Drawn
Man-of-the-match: Younis Khan.